X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/71e030352d74e4e6aed28cfcb0ea6edf3d17af6e..be90c029fd255fba3eb7379aabef5780df210ad8:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 6985cc883e..976d90ddc7 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -111,6 +111,9 @@ TRUE if the field index is valid, FALSE otherwise.
 
 \helpref{wxRect}{wxrect}
 
+\perlnote{In wxPerl this function returns a {\tt Wx::Rect} if the field
+  index is valid, {\tt undef} otherwise.}
+
 \membersection{wxStatusBar::GetFieldsCount}\label{wxstatusbargetfieldscount}
 
 \constfunc{int}{GetFieldsCount}{\void}
