X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/71e030352d74e4e6aed28cfcb0ea6edf3d17af6e..afbe906abdf9aa69a56571b8b20b095351dd8f34:/docs/latex/wx/statusbr.tex?ds=sidebyside

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 6985cc883e..72ca80f542 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -22,7 +22,7 @@ be variable length according to the size of the window.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxSB\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
+\twocolitem{\windowstyle{wxST\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
 the status bar.}
 \end{twocollist}
 
@@ -111,6 +111,9 @@ TRUE if the field index is valid, FALSE otherwise.
 
 \helpref{wxRect}{wxrect}
 
+\perlnote{In wxPerl this function returns a {\tt Wx::Rect} if the field
+  index is valid, {\tt undef} otherwise.}
+
 \membersection{wxStatusBar::GetFieldsCount}\label{wxstatusbargetfieldscount}
 
 \constfunc{int}{GetFieldsCount}{\void}
