X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/716b1f7091622187312a86257eac0570d0ccd8a2..daf5b37afdda9e8ab7f909e01ffd6387219a80ea:/docs/latex/wx/strmzlib.tex

diff --git a/docs/latex/wx/strmzlib.tex b/docs/latex/wx/strmzlib.tex
index eda8d2f207..0cddc65c1f 100644
--- a/docs/latex/wx/strmzlib.tex
+++ b/docs/latex/wx/strmzlib.tex
@@ -13,12 +13,18 @@ not supported, it always returns $0$.
 
 \wxheading{Derived from}
 
-\helpref{wxFilterInputStream}{wxfilterinputstream}
+\helpref{wxFilterInputStream}{wxfilterinputstream}\\
+\helpref{wxInputStream}{wxinputstream}\\
+\helpref{wxStreamBase}{wxstreambase}
 
 \wxheading{Include files}
 
 <wx/zstream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxInputStream}{wxinputstream}, 
@@ -88,12 +94,18 @@ The stream is not seekable, \helpref{SeekO()}{wxoutputstreamseeko} returns
 
 \wxheading{Derived from}
 
-\helpref{wxFilterOutputStream}{wxfilteroutputstream}
+\helpref{wxFilterOutputStream}{wxfilteroutputstream}\\
+\helpref{wxOutputStream}{wxoutputstream}\\
+\helpref{wxStreamBase}{wxstreambase}
 
 \wxheading{Include files}
 
 <wx/zstream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxOutputStream}{wxoutputstream},
