X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/716b1f7091622187312a86257eac0570d0ccd8a2..360c6b7edb166d04936ff4ed92a7b099ac042431:/docs/latex/wx/fltinstr.tex

diff --git a/docs/latex/wx/fltinstr.tex b/docs/latex/wx/fltinstr.tex
index f521c0ddff..f20a3659c9 100644
--- a/docs/latex/wx/fltinstr.tex
+++ b/docs/latex/wx/fltinstr.tex
@@ -16,6 +16,10 @@ from another stream and pass it to the requester.
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Note}
 
 The interface of this class is the same as that of wxInputStream. Only a constructor
