X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/712969258a099186911f0f2982ae922011c4b6e8..24174c30e0fe2fe0bdbe6e54b98c084b38e53494:/docs/latex/wx/splitter.tex?ds=sidebyside

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index 5defafa745..b37d1b73eb 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -55,7 +55,7 @@ it is set, or to prevent the change from taking place.
 Processes a wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED event.}
 \twocolitem{{\bf EVT\_SPLITTER\_UNSPLIT(id, func)}}{The splitter has been just
 unsplit. Processes a wxEVT\_COMMAND\_SPLITTER\_UNSPLIT event.}
-\twocolitem{{\bf EVT\_SPLITTER\_DOUBLECLICKED(id, func)}}{The sash was double
+\twocolitem{{\bf EVT\_SPLITTER\_DCLICK(id, func)}}{The sash was double
 clicked. The default behaviour is to unsplit the window when this happens
 (unless the minimum pane size has been set to a value greater than zero).
 Processes a wxEVT\_COMMAND\_SPLITTER\_DOUBLECLICKED event.}
