X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/706f14210b7d782742b4fdbaea0adc25bdcced4d..dceb1c097c8c24b398f48b482220c358bc7b4db4:/docs/latex/wx/size.tex

diff --git a/docs/latex/wx/size.tex b/docs/latex/wx/size.tex
index 22bf9c998c..b1376b4f21 100644
--- a/docs/latex/wx/size.tex
+++ b/docs/latex/wx/size.tex
@@ -3,7 +3,7 @@
 A {\bf wxSize} is a useful data structure for graphics operations.
 It simply contains integer {\it width} and {\it height} members.
 
-wxSize is used throughout wxWindows as well as wxPoint which, although almost
+wxSize is used throughout wxWidgets as well as wxPoint which, although almost
 equivalent to wxSize, has a different meaning: wxPoint represents a position
 while wxSize - the size.
 
@@ -27,7 +27,7 @@ None
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 
-\membersection{wxSize::wxSize}
+\membersection{wxSize::wxSize}\label{wxsizector}
 
 \func{}{wxSize}{\void}
 
@@ -39,7 +39,7 @@ Creates a size object.
 
 \membersection{wxSize::DecTo}\label{wxsizedecto}
 
-\func{wxSize\&}{DecTo}{\param{const wxSize\& }{size}}
+\func{void}{DecTo}{\param{const wxSize\& }{size}}
 
 Decrements this object so that both of its dimensions are not greater than the
 corresponding dimensions of the \arg{size}.
@@ -51,10 +51,10 @@ corresponding dimensions of the \arg{size}.
 
 \membersection{wxSize::IsFullySpecified}\label{wxsizeisfullyspecified}
 
-\constfunc{IsFullySpecified}{\void}
+\constfunc{bool}{IsFullySpecified}{\void}
 
 Returns \true if neither of the size object components is equal to $-1$, which
-is used as default for the size values in wxWindows (hence the predefined 
+is used as default for the size values in wxWidgets (hence the predefined 
 \texttt{wxDefaultSize} has both of its components equal to $-1$).
 
 This method is typically used before calling 
@@ -78,7 +78,7 @@ Gets the height member.
 
 \membersection{wxSize::IncTo}\label{wxsizeincto}
 
-\func{wxSize\&}{IncTo}{\param{const wxSize\& }{size}}
+\func{void}{IncTo}{\param{const wxSize\& }{size}}
 
 Increments this object so that both of its dimensions are not less than the
 corresponding dimensions of the \arg{size}.
@@ -129,7 +129,7 @@ Sets the height.
 Sets the width.
 
 
-\membersection{wxSize::operator $=$}
+\membersection{wxSize::operator $=$}\label{wxsizeassign}
 
 \func{void}{operator $=$}{\param{const wxSize\& }{sz}}
 
