X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/703f03c342e4fd0c7f5452831afaff67b4bfecc2..f3d6a60294f119d6f6e7f1eae68301dcbb3dd6ed:/docs/latex/wx/list.tex

diff --git a/docs/latex/wx/list.tex b/docs/latex/wx/list.tex
index dc6ace118a..9f3a5f8385 100644
--- a/docs/latex/wx/list.tex
+++ b/docs/latex/wx/list.tex
@@ -9,7 +9,7 @@ when random access is required.
 While wxList class in the previous versions of wxWindows only could contain
 elements of type wxObject and had essentially untyped interface (thus allowing
 you to put apples in the list and read back oranges from it), the new wxList
-classes family may contain elements of any type and has much more stricter type
+classes family may contain elements of any type and has much more strict type
 checking. Unfortunately, it also requires an additional line to be inserted in
 your program for each list class you use (which is the only solution short of
 using templates which is not done in wxWindows because of portability issues).
@@ -68,7 +68,7 @@ For compatibility with previous versions wxList and wxStringList classes are
 still defined, but their usage is deprecated and they will disappear in the
 future versions completely. The use of the latter is especially discouraged as
 it is not only unsafe but is also much less efficient than 
-\helpref{wxArrayString|{wxarraystring} class.
+\helpref{wxArrayString}{wxarraystring} class.
 
 In the documentation of the list classes below, you should replace wxNode with
 wxListName::Node and wxObject with the list element type (i.e. the first
@@ -230,7 +230,7 @@ Returns the last node in the list (NULL if the list is empty).
 
 \func{int}{IndexOf}{\param{wxObject*}{ obj }}
 
-Returns the index of {\it obj} within the list or NOT\_FOUND if {\it obj} 
+Returns the index of {\it obj} within the list or wxNOT\_FOUND if {\it obj} 
 is not found in the list.
 
 \membersection{wxList::Insert}\label{wxlistinsert}
