X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/702a26fded8c16bf858631d929580441ba23fdc4..42d9ad7949254ed53f89ad6306dcb2a266bfffb3:/docs/latex/wx/sizer.tex?ds=sidebyside

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index 0c8b32a5b0..8800335c25 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -222,13 +222,11 @@ Returns true if the child item was found and detached, false otherwise.
 
 \func{wxSize}{Fit}{\param{wxWindow* }{window}}
 
-Tell the sizer to resize the \arg{window} to match the sizer's minimal size. This
-is commonly done in the constructor of the window itself, see sample in the description
+Tell the sizer to resize the \arg{window} so that its client area matchesthe 
+sizer's minimal size. This is commonly done in the constructor of the window
+itself, see sample in the description
 of \helpref{wxBoxSizer}{wxboxsizer}. Returns the new size.
 
-For a top level window this is the total window size, not client size.
-
-
 \membersection{wxSizer::FitInside}\label{wxsizerfitinside}
 
 \func{void}{FitInside}{\param{wxWindow* }{window}}
