X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/700d0a9a6b05adc3bb2ea20a7eacf820727ff1f0..a0c2e4a050f4f2e8d344483ba4cfaa8b08a1fe87:/docs/latex/wx/datectrl.tex?ds=inline

diff --git a/docs/latex/wx/datectrl.tex b/docs/latex/wx/datectrl.tex
index fb8d613aa2..09c2f933aa 100644
--- a/docs/latex/wx/datectrl.tex
+++ b/docs/latex/wx/datectrl.tex
@@ -30,6 +30,10 @@ It is only available if \texttt{wxUSE\_DATEPICKCTRL} is set to $1$.
 
 <wx/datectrl.h>
 
+\wxheading{Library}
+
+\helpref{wxAdv}{librarieslist}
+
 (only available if \texttt{wxUSE\_DATEPICKCTRL} is set to $1$)
 
 \wxheading{Window styles}
@@ -154,7 +158,11 @@ outside of the current range, an invalid object is returned.
 
 \func{void}{SetFormat}{\param{const wxChar*}{ format}}
 
-Sets the display format for the date in the control. See wxDateTime for the meaning of format strings.
+Please note that this function is only available in the generic version of this
+control. The native version always uses the current system locale.
+
+Sets the display format for the date in the control. See wxDateTime for the
+meaning of format strings.
 
 \wxheading{Remarks}
 
