X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6fb26ea3b3784922bd0613a5e96fda78fac684ac..dbdb39b2d0b8c3359eab1693fd1fc786499f62d7:/docs/latex/wx/debugcxt.tex?ds=sidebyside

diff --git a/docs/latex/wx/debugcxt.tex b/docs/latex/wx/debugcxt.tex
index e157d32eab..0783080462 100644
--- a/docs/latex/wx/debugcxt.tex
+++ b/docs/latex/wx/debugcxt.tex
@@ -11,6 +11,10 @@ USE\_DEBUG\_CONTEXT to 0 is wx\_setup.h
 
 No parent class.
 
+\wxheading{Include files}
+
+<wx/memory.h>
+
 \wxheading{See also}
 
 \overview{Overview}{wxdebugcontextoverview}
@@ -251,6 +255,10 @@ This is soon to be obsolete, replaced by \helpref{wxLog}{wxlog} functionality.
 
 streambuf
 
+\wxheading{Include files}
+
+<wx/memory.h>
+
 \wxheading{Example}
 
 \begin{verbatim}
