X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6fb26ea3b3784922bd0613a5e96fda78fac684ac..c0ed460c2e7802793d591c84f3cfdbff159c5549:/docs/latex/wx/sashevt.tex

diff --git a/docs/latex/wx/sashevt.tex b/docs/latex/wx/sashevt.tex
index 379628c5e6..b3b02eec3f 100644
--- a/docs/latex/wx/sashevt.tex
+++ b/docs/latex/wx/sashevt.tex
@@ -51,8 +51,7 @@ drag was OK or out of the current allowed range.
 
 \wxheading{See also}
 
-\helpref{wxWindow::OnSash}{wxwindowonactivate},\rtfsp
-\helpref{wxApp::OnSash}{wxapponactivate},\rtfsp
+\helpref{wxSashWindow}{wxsashwindow},\rtfsp
 \helpref{Event handling overview}{eventhandlingoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
