X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6fb26ea3b3784922bd0613a5e96fda78fac684ac..9018abe3ef28d237b0421c8d96987907adbe5532:/docs/latex/wx/tguide.tex

diff --git a/docs/latex/wx/tguide.tex b/docs/latex/wx/tguide.tex
index 089fedc0a9..317b9dcb0e 100644
--- a/docs/latex/wx/tguide.tex
+++ b/docs/latex/wx/tguide.tex
@@ -24,7 +24,7 @@ and \helpref{wxFileDialog}{wxfiledialog}.
 
 You never draw directly onto a window --- you use a {\it device context} (DC). \helpref{wxDC}{wxdc} is
 the base for \helpref{wxClientDC}{wxclientdc}, \helpref{wxPaintDC}{wxpaintdc}, \helpref{wxMemoryDC}{wxmemorydc}, \helpref{wxPostScriptDC}{wxpostscriptdc},
-\rtfsp\helpref{wxMemoryDC}{wxmemorydc}, \helpref{wxMetaFileDC}{wxmetafiledc} and \helpref{wxPrinterDC}{wxprinterdc}.
+\rtfsp\helpref{wxMemoryDC}{wxmemorydc}, \helpref{wxMetafileDC}{wxmetafiledc} and \helpref{wxPrinterDC}{wxprinterdc}.
 If your drawing functions have {\bf wxDC} as a parameter, you can pass any of these DCs
 to the function, and thus use the same code to draw to several different devices.
 You can draw using the member functions of {\bf wxDC}, such as \helpref{wxDC::DrawLine}{wxdcdrawline}\rtfsp
