X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6f63b8adb892f2fd3b051847ccff819cf49b3782..4383e2b12aa48171114576725d5cead06e7e962a:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 9cdab0ee54..261d762315 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -39,7 +39,7 @@ from an {\bf OnSize} event handler.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxStatusBar::wxStatusBar}\label{wxstatusbarconstr}
+\membersection{wxStatusBar::wxStatusBar}\label{wxstatusbarctor}
 
 \func{}{wxStatusBar}{\void}
 
@@ -67,7 +67,7 @@ individual windows.}
 
 \helpref{wxStatusBar::Create}{wxstatusbarcreate}
 
-\membersection{wxStatusBar::\destruct{wxStatusBar}}
+\membersection{wxStatusBar::\destruct{wxStatusBar}}\label{wxstatusbardtor}
 
 \func{void}{\destruct{wxStatusBar}}{\void}
 
@@ -81,7 +81,7 @@ Destructor.
 
 Creates the window, for two-step construction.
 
-See \helpref{wxStatusBar::wxStatusBar}{wxstatusbarconstr} for details.
+See \helpref{wxStatusBar::wxStatusBar}{wxstatusbarctor} for details.
 
 \membersection{wxStatusBar::GetFieldRect}\label{wxstatusbargetfieldrect}
 
@@ -198,12 +198,12 @@ Sets the text for one field.
 Sets the widths of the fields in the status line. There are two types of
 fields: fixed widths one and variable width fields. For the fixed width fields
 you should specify their (constant) width in pixels. For the variable width
-fields, specify a negative number which indicates how should the field expand:
+fields, specify a negative number which indicates how the field should expand:
 the space left for all variable width fields is divided between them according
 to the absolute value of this number. A variable width field with width of $-2$
 gets twice as much of it as a field with width $-1$ and so on.
 
-For example, to create one fixed width field of width $50$ in the right part of
+For example, to create one fixed width field of width $100$ in the right part of
 the status bar and two more fields which get $66$\% and $33$\% of the remaining
 space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
@@ -215,7 +215,7 @@ time it was called.}
 
 \docparam{widths}{Contains an array of {\it n} integers, each of which is
 either an absolute status field width in pixels if positive or indicates a
-variable width field if negative}
+variable width field if negative.}
 
 \wxheading{Remarks}
 
