X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6e8515a3e39851ec562ee3def4ffcced182df110..525b0568c9882692cf31bf4d5a308940154cb350:/contrib/docs/latex/fl/body.tex

diff --git a/contrib/docs/latex/fl/body.tex b/contrib/docs/latex/fl/body.tex
index 0d3cac65f1..a900fd7dda 100644
--- a/contrib/docs/latex/fl/body.tex
+++ b/contrib/docs/latex/fl/body.tex
@@ -30,7 +30,7 @@ is given as the moving bar displaces other bars.
 Other features: the splitter bar shows a dotted thick line as
 it's dragged. Single-clicking on a row handle minimizes it to
 a horizontal tab which is given its own narrow row. This allows
-the user to temporarily hide a row whilst allowing quick access
+the user to temporarily hide a row while allowing quick access
 to it when required.
 
 A close button (x) hides a bar completely. You can get it back again
