X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6e6110ee8194ee39944dffd57cce9f22cd8b961e..f811bc9ac07404a8e90570b243918d11289ef1e2:/docs/latex/wx/mutexlck.tex?ds=inline

diff --git a/docs/latex/wx/mutexlck.tex b/docs/latex/wx/mutexlck.tex
index b0d565663c..5fa53b7354 100644
--- a/docs/latex/wx/mutexlck.tex
+++ b/docs/latex/wx/mutexlck.tex
@@ -11,26 +11,33 @@ usage.
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
-\helpref{wxMutex}{wxmutex},
-\helpref{wxCriticalSectionLocker}{wxcriticalsectionlocker}
+\helpref{wxMutex}{wxmutex}, \helpref{wxCriticalSectionLocker}{wxcriticalsectionlocker}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxMutexLocker::wxMutexLocker}\label{wxmutexlockerctor}
+
 \func{}{wxMutexLocker}{\param{wxMutex *}{mutex}}
 
-Constructs a wxMutexLocker object associated with mutex which must be non NULL
-and locks it. Call \helpref{IsOk}{wxmutexisok} to check if the mutex was
+Constructs a wxMutexLocker object associated with mutex which must be non-NULL
+and locks it. Call \helpref{IsLocked}{wxmutexlockerisok} to check if the mutex was
 successfully locked.
 
 \membersection{wxMutexLocker::\destruct{wxMutexLocker}}\label{wxmutexlockerdtor}
+
 \func{}{\destruct{wxMutexLocker}}{\void}
 
-Destuctor releases the mutex if it was successfully acquired in the ctor.
+Destructor releases the mutex if it was successfully acquired in the ctor.
 
 \membersection{wxMutexLocker::IsOk}\label{wxmutexlockerisok}
+
 \constfunc{bool}{IsOk}{\void}
 
 Returns TRUE if mutex was acquired in the constructor, FALSE otherwise.
+
