X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6e6110ee8194ee39944dffd57cce9f22cd8b961e..9c4ba61452d9381c9d71242f0d1610fb2551c846:/docs/latex/wx/critsect.tex

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index 884c3ed19c..0851745cd8 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,6 +1,6 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used exactly for the same purpose as 
+A critical section object is used for the same exactly purpose as 
 \helpref{mutexes}{wxMutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
@@ -18,24 +18,31 @@ possible instead of directly using wxCriticalSection for the same reasons
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
-\helpref{wxThread}{wxthread}, \helpref{wxCondition}{wxcondition},
+\helpref{wxThread}{wxthread}, \helpref{wxCondition}{wxcondition}, 
 \helpref{wxMutexLocker}{wxmutexlocker}, \helpref{wxCriticalSection}{wxcriticalsection}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxCriticalSection::wxCriticalSection}\label{wxcriticalsectionctor}
+
 \func{}{wxCriticalSection}{\void}
 
 Default constructor initializes critical section object.
 
 \membersection{wxCriticalSection::\destruct{wxCriticalSection}}\label{wxcriticalsectiondtor}
+
 \func{}{\destruct{wxCriticalSection}}{\void}
 
 Destructor frees the ressources.
 
 \membersection{wxCriticalSection::Enter}\label{wxcriticalsectionenter}
+
 \func{void }{Enter}{\void}
 
 Enter the critical section (same as locking a mutex). There is no error return
@@ -43,7 +50,9 @@ for this function. After entering the critical section protecting some global
 data the thread running in critical section may safely use/modify it.
 
 \membersection{wxCriticalSection::Leave}\label{wxcriticalsectionleave}
+
 \func{void }{Leave}{\void}
 
 Leave the critical section allowing other threads use the global data protected
 by it. There is no error return for this function.
+
