X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6d98ee990e1c8ee3bc5f347b3317b204aa1461c4..4c85ab7569677ff535c258c7f25ad428ba1ed406:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index b81f34821c..4f94f2b2a6 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -155,7 +155,7 @@ Returns {\tt true} if the child process standard output stream is opened.
 
 \membersection{wxProcess::Kill}\label{wxprocesskill}
 
-\func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}}
+\func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}, \param{int }{flags = wxKILL\_NOCHILDREN}}
 
 Send the specified signal to the given process. Possible signal values are:
 
@@ -185,6 +185,11 @@ enum wxSignal
 under both Unix and Windows but all the other signals are equivalent to
 {\tt wxSIGTERM} under Windows.
 
+The {\it flags} parameter can be wxKILL\_NOCHILDREN (the default),
+or wxKILL\_CHILDREN, in which case the child processes of this
+process will be killed too. Note that under Unix, for wxKILL\_CHILDREN
+to work you should have created the process passing wxEXEC\_MAKE\_GROUP\_LEADER.
+
 Returns the element of {\tt wxKillError} enum:
 
 \begin{verbatim}
@@ -228,7 +233,7 @@ It raises a wxWidgets event when it isn't overridden.
 
 \membersection{wxProcess::Open}\label{wxprocessopen}
 
-\func{static wxProcess *}{Open}{\param{const wxString\& }{cmd} \param{int }{flags = wxEXEC\_ASYNC}}
+\func{static wxProcess *}{Open}{\param{const wxString\& }{cmd}, \param{int }{flags = wxEXEC\_ASYNC}}
 
 This static method replaces the standard {\tt popen()} function: it launches
 the process specified by the {\it cmd} parameter and returns the wxProcess
