X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6d94009faa51ae4018e08ced13cfdfe575b03f08..9475f9e7e14d1353d4a2b16615f3d0d4457a0526:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 505832463b..0b125a7da9 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -88,7 +88,7 @@ The possible values for \arg{cat} are:
 
 Detaches this object from its library handle, i.e. the object will not unload
 the library any longer in its destructor but it is now the callers
-responsability to do this using \helpref{Unload}{wxdynamiclibraryunload}.
+responsibility to do this using \helpref{Unload}{wxdynamiclibraryunload}.
 
 
 \membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
@@ -103,6 +103,19 @@ contains no such symbol.
 \helpref{wxDYNLIB\_FUNCTION}{wxdynlibfunction}
 
 
+\membersection{wxDynamicLibrary::GetSymbolAorW}\label{wxdynamiclibrarygetsymbolaorw}
+
+\constfunc{void *}{GetSymbolAorW}{\param{const wxString\& }{name}}
+
+This function is available only under Windows as it is only useful when
+dynamically loading symbols from standard Windows DLLs. Such functions have
+either \texttt{'A'} (in ANSI build) or \texttt{'W'} (in Unicode, or wide
+character build) suffix if they take string parameters. Using this function you
+can use just the base name of the function and the correct suffix is appende
+automatically depending on the current build. Otherwise, this method is
+identical to \helpref{GetSymbol}{wxdynamiclibrarygetsymbol}.
+
+
 \membersection{wxDynamicLibrary::GetProgramHandle}\label{wxdynamiclibrarygetprogramhandle}
 
 \func{static wxDllType}{GetProgramHandle}{\void}
@@ -136,7 +149,7 @@ Returns \true if the library was successfully loaded, \false otherwise.
 This static method returns an \helpref{array}{wxarray} containing the details
 of all modules loaded into the address space of the current project, the array
 elements are object of \texttt{wxDynamicLibraryDetails} class. The array will
-be empty if an error occured.
+be empty if an error occurred.
 
 This method is currently implemented only under Win32 and Linux and is useful
 mostly for diagnostics purposes.
