X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6d94009faa51ae4018e08ced13cfdfe575b03f08..763b330106e9d3c9c198fc1b1cac4e1ca06c222f:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 505832463b..5eaaa4265f 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -88,7 +88,7 @@ The possible values for \arg{cat} are:
 
 Detaches this object from its library handle, i.e. the object will not unload
 the library any longer in its destructor but it is now the callers
-responsability to do this using \helpref{Unload}{wxdynamiclibraryunload}.
+responsibility to do this using \helpref{Unload}{wxdynamiclibraryunload}.
 
 
 \membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
@@ -136,7 +136,7 @@ Returns \true if the library was successfully loaded, \false otherwise.
 This static method returns an \helpref{array}{wxarray} containing the details
 of all modules loaded into the address space of the current project, the array
 elements are object of \texttt{wxDynamicLibraryDetails} class. The array will
-be empty if an error occured.
+be empty if an error occurred.
 
 This method is currently implemented only under Win32 and Linux and is useful
 mostly for diagnostics purposes.
