X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6d06e061dc11140151be2914c30c759ee15e3fe7..fe4fcb5f4f4fc7ee4c116673c213f53b2bc798fc:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index 33320e4997..9cd305c6b9 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -42,7 +42,7 @@ Returns the number of bytes written during the last
 error on the stream if it is only temporarily impossible to write to it.
 
 
-\membersection{wxOutputStream::PutC}
+\membersection{wxOutputStream::PutC}\label{wxoutputstreamputc}
 
 \func{void}{PutC}{\param{char}{ c}}
 
