X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6d06e061dc11140151be2914c30c759ee15e3fe7..65baafba0e8cd74f2264b7e2f7625ff5bea84864:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 21edad6b88..d5554cd07c 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -97,7 +97,7 @@ id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
+\func{bool}{Start}{\param{int }{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
 
 (Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
 the previous value is used. Returns {\tt false} if the timer could not be started,
