X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6c5d62917d14278d8925a73d754965713e11e32f..58fda45507ec59ab5a6e89436ccff29023db9871:/docs/latex/wx/display.tex

diff --git a/docs/latex/wx/display.tex b/docs/latex/wx/display.tex
index fd78c8f15e..e1525547ca 100644
--- a/docs/latex/wx/display.tex
+++ b/docs/latex/wx/display.tex
@@ -10,6 +10,10 @@ None
 
 <wx/display.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxClientDisplayRect}{wxclientdisplayrect}, \helpref{wxDisplaySize}{wxdisplaysize}, \helpref{wxDisplaySizeMM}{wxdisplaysizemm}
@@ -19,7 +23,7 @@ None
 
 \membersection{wxDisplay::wxDisplay}\label{wxdisplayctor}
 
-\func{}{wxDisplay}{\param{size\_t }{index = 0}}
+\func{}{wxDisplay}{\param{unsigned }{index = 0}}
 
 Constructor, setting up a wxDisplay instance with the specified display.
 
@@ -73,7 +77,7 @@ there is a taskbar (or equivalent) on this display.
 
 \membersection{wxDisplay::GetCount}\label{wxdisplaygetcount}
 
-\func{static size\_t}{GetCount}{\void}
+\func{static unsigned }{GetCount}{\void}
 
 Returns the number of connected displays.
 
@@ -106,7 +110,7 @@ Returns the index of the display on which the given point lies.  Returns
 
 \membersection{wxDisplay::GetFromWindow}\label{wxdisplaygetfromwindow}
 
-\func{static int}{GetFromWindow}{\param{wxWindow* }{win}}
+\func{static int}{GetFromWindow}{\param{const wxWindow* }{win}}
 
 Returns the index of the display on which the given window lies.
 
