X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6be663cf0d9c0ce48dea6c1c2f628ed376f128c0..b953bdc2934895fa31d859be25be1f850701c2c3:/docs/latex/wx/url.tex?ds=sidebyside

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index 66c49c7aad..91e6ceff73 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -86,7 +86,8 @@ Returns the initialized stream. You will have to delete it yourself.
 
 \wxheading{See also}
 
-\helpref{wxInputStream}{wxinputstream}
+%\helpref{wxInputStream}{wxinputstream}
+wxInputStream
 
 %
 % SetDefaultProxy
