X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6aa358aebb951956f0e0ab645788e00a4b904886..8f0db49cd26130a7bc49816853ce832324ee85da:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index d23f7160f2..09ba843d9f 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -461,15 +461,34 @@ if successful, FALSE otherwise.
 Makes a copy of the string {\it s} using the C++ new operator, so it can be
 deleted with the {\it delete} operator.
 
+\membersection{::wxIsEmpty}\label{wxisempty}
+
+\func{bool}{wxIsEmpty}{\param{const char *}{ p}}
+
+Returns {\tt TRUE} if the pointer is either {\tt NULL} or points to an empty
+string, {\tt FALSE} otherwise.
+
+\membersection{::wxStricmp}\label{wxstricmp}
+
+\func{int}{wxStricmp}{\param{const char *}{p1}, \param{const char *}{p2}}
+
+Returns a negative value, 0, or positive value if {\it p1} is less than, equal
+to or greater than {\it p2}. The comparison is case-insensitive.
+
+This function complements the standard C function {\it strcmp()} which performs
+case-sensitive comparison.
+
 \membersection{::wxStringMatch}
 
 \func{bool}{wxStringMatch}{\param{const wxString\& }{s1}, \param{const wxString\& }{s2},\\
   \param{bool}{ subString = TRUE}, \param{bool}{ exact = FALSE}}
 
-Returns TRUE if the substring {\it s1} is found within {\it s2},
-ignoring case if {\it exact} is FALSE. If {\it subString} is FALSE,
+Returns {\tt TRUE} if the substring {\it s1} is found within {\it s2},
+ignoring case if {\it exact} is FALSE. If {\it subString} is {\tt FALSE},
 no substring matching is done.
 
+This function is obsolete, use \helpref{wxString::Find}{wxstringfind} instead.
+
 \membersection{::wxStringEq}\label{wxstringeq}
 
 \func{bool}{wxStringEq}{\param{const wxString\& }{s1}, \param{const wxString\& }{s2}}
@@ -480,30 +499,15 @@ A macro defined as:
 #define wxStringEq(s1, s2) (s1 && s2 && (strcmp(s1, s2) == 0))
 \end{verbatim}
 
-\membersection{::IsEmpty}\label{isempty}
-
-\func{bool}{IsEmpty}{\param{const char *}{ p}}
-
-Returns TRUE if the string is empty, FALSE otherwise. It is safe to pass NULL
-pointer to this function and it will return TRUE for it.
-
-\membersection{::Stricmp}\label{stricmp}
-
-\func{int}{Stricmp}{\param{const char *}{p1}, \param{const char *}{p2}}
-
-Returns a negative value, 0, or positive value if {\it p1} is less than, equal
-to or greater than {\it p2}. The comparison is case-insensitive.
-
-This function complements the standard C function {\it strcmp()} which performs
-case-sensitive comparison.
+This function is obsolete, use \helpref{wxString}{wxstring} instead.
 
-\membersection{::Strlen}\label{strlen}
+\membersection{::wxStrlen}\label{wxstrlen}
 
-\func{size\_t}{Strlen}{\param{const char *}{ p}}
+\func{size\_t}{wxStrlen}{\param{const char *}{ p}}
 
 This is a safe version of standard function {\it strlen()}: it does exactly the
 same thing (i.e. returns the length of the string) except that it returns 0 if
-{\it p} is the NULL pointer.
+{\it p} is the {\tt NULL} pointer.
 
 \membersection{::wxGetTranslation}\label{wxgettranslation}
 
@@ -1751,13 +1755,56 @@ this default behaviour.
 
 \membersection{::wxKill}\label{wxkill}
 
-\func{int}{wxKill}{\param{long}{ pid}, \param{int}{ sig}}
+\func{int}{wxKill}{\param{long}{ pid}, \param{int}{ sig = wxSIGTERM}, \param{wxKillError }{*rc = NULL}}
 
-Under Unix (the only supported platform), equivalent to the Unix kill function.
-Returns 0 on success, -1 on failure.
+Equivalent to the Unix kill function: send the given signal {\it sig} to the
+process with PID {\it pid}. The valud signal values are
 
-Tip: sending a signal of 0 to a process returns -1 if the process does not exist.
-It does not raise a signal in the receiving process.
+\begin{verbatim}
+enum wxSignal
+{
+    wxSIGNONE = 0,  // verify if the process exists under Unix
+    wxSIGHUP,
+    wxSIGINT,
+    wxSIGQUIT,
+    wxSIGILL,
+    wxSIGTRAP,
+    wxSIGABRT,
+    wxSIGEMT,
+    wxSIGFPE,
+    wxSIGKILL,      // forcefully kill, dangerous!
+    wxSIGBUS,
+    wxSIGSEGV,
+    wxSIGSYS,
+    wxSIGPIPE,
+    wxSIGALRM,
+    wxSIGTERM       // terminate the process gently
+};
+\end{verbatim}
+
+{\tt wxSIGNONE}, {\tt wxSIGKILL} and {\tt wxSIGTERM} have the same meaning
+under both Unix and Windows but all the other signals are equivalent to 
+{\tt wxSIGTERM} under Windows.
+
+Returns 0 on success, -1 on failure. If {\it rc} parameter is not NULL, it will
+be filled with an element of {\tt wxKillError} enum:
+
+\begin{verbatim}
+enum wxKillError
+{
+    wxKILL_OK,              // no error
+    wxKILL_BAD_SIGNAL,      // no such signal
+    wxKILL_ACCESS_DENIED,   // permission denied
+    wxKILL_NO_PROCESS,      // no such process
+    wxKILL_ERROR            // another, unspecified error
+};
+\end{verbatim}
+
+\wxheading{See also}
+
+\helpref{wxProcess::Kill}{wxprocesskill},\rtfsp
+\helpref{wxProcess::Exists}{wxprocessexists},\rtfsp
+\helpref{Exec sample}{sampleexec}
 
 \wxheading{Include files}
 
@@ -1979,6 +2026,20 @@ This function is now obsolete, replaced by \helpref{Log functions}{logfunctions}
 
 <wx/memory.h>
 
+\membersection{::wxTrap}\label{wxtrap}
+
+\func{void}{wxTrap}{\void}
+
+In debug mode (when {\tt \_\_WXDEBUG\_\_} is defined) this function generates a
+debugger exception meaning that the control is passed to the debugger if one is
+attached to the process. Otherwise the program just terminates abnormally.
+
+In release mode this function does nothing.
+
+\wxheading{Include files}
+
+<wx/debug.h>
+
 \membersection{::wxUsleep}\label{wxusleep}
 
 \func{void}{wxUsleep}{\param{unsigned long}{ milliseconds}}
