X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6a7e6411614132968a7a0206173609ae62ce5cf6..93fa67c0e6124d2657488971800c8fd068dc0d0e:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 2e130b44e1..6eeae2fb8b 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -523,7 +523,7 @@ Note that it is not possible to call this function twice for the same frame obje
 
 \membersection{wxFrame::SetShape}\label{wxframesetshape}
 
-\func{bool}{SetShape}{\param{const wxRegion&}{ region}}
+\func{bool}{SetShape}{\param{const wxRegion\&}{ region}}
 
 If the platform supports it, sets the shape of the window to that
 depicted by \it{region}.  The system will not display or
