X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/68d411dc5724b9284455a31ef8a8d6d99c18d224..c65650d7b5472d00da0a0516ff1a2ccf53746319:/docs/latex/wx/tchanges.tex

diff --git a/docs/latex/wx/tchanges.tex b/docs/latex/wx/tchanges.tex
index d90d946d5d..38e812cbe7 100644
--- a/docs/latex/wx/tchanges.tex
+++ b/docs/latex/wx/tchanges.tex
@@ -66,7 +66,7 @@ wxWindow::m\_font and m\_backgroundColour/m\_foregroundColour are no longer alwa
       size of the control to the blending of the minsize and bestsize.
       \helpref{wxWindow::SetBestFittingSize}{wxwindowsetbestfittingsize} was added to help with this,
       although most controls don't need to call it directly because it
-      is called indirectly via the SetInitialSize called in the base
+      is called indirectly via the \helpref{SetInitialBestSize}{wxwindowsetinitialbestsize} called in the base
       classes.
 \end{itemize}
 
@@ -92,37 +92,37 @@ sizer->Add(win);
   non-control custom windows.)
 
 \begin{itemize}\itemsep=0pt
-\item Either override or inherit a meaningful DoGetBestSize method
+\item Either override or inherit a meaningful \helpref{DoGetBestSize}{wxwindowdogetbestsize} method
       that calculates whatever size is "best" for the control.  Once
       that size is calculated then there should normally be a call to
-      CacheBestSize to save it for later use, unless for some reason
+      \helpref{CacheBestSize}{wxwindowcachebestsize} to save it for later use, unless for some reason
       you want the best size to be recalculated on every layout.
 
 \item Any method that changes the attributes of the control such that
-      the best size will change should call InvalidateBestSize so it
+      the best size will change should call \helpref{InvalidateBestSize}{wxwindowinvalidatebestsize} so it
       will be recalculated the next time it is needed.
 
 \item The control's constructor and/or Create method should ensure
       that the minsize is set to the size passed in, and that the
       control is sized to a blending of the min size and best size.
-      This can be done by calling SetBestFittingSize.
+      This can be done by calling \helpref{SetBestFittingSize}{wxwindowsetbestfittingsize}.
 \end{itemize}
 
 
 
 \subsubsection{Massive wxURL Rewrite}\label{wxurlrewrite}
 
-wxURL has undergone some radical changes.
+\helpref{wxURL}{wxurl} has undergone some radical changes.
 
 \begin{itemize}\itemsep=0pt
-\item Many accessors of wxURL - GetHostName, GetProtocolName, and GetPath,
-      have been replaced by its parent's (wxURI) counterparts - GetServer,
-      GetScheme, and GetPath, respectively.
+\item Many accessors of \helpref{wxURL}{wxurl} - GetHostName, GetProtocolName, and GetPath,
+      have been replaced by its parent's (\helpref{wxURI}{wxuri}) counterparts - \helpref{GetServer}{wxurigetserver},
+      \helpref{GetScheme}{wxurigetscheme}, and \helpref{GetPath}{wxurigetpath}, respectively.
 
-\item ConvertToValidURI has been replaced by wxURI.  Do not use
+\item ConvertToValidURI has been replaced by \helpref{wxURI}{wxuri}.  Do not use
       ConvertToValidURI for future applications.
 
-\item ConvertFromURI has been replaced by wxURI::Unescape.
+\item ConvertFromURI has been replaced by \helpref{wxURI::Unescape}{wxuriunescape}.
 \end{itemize}
 
 
