X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/68a602fcd2b0856bad6f79b957fa48beb6e10635..7946d7deaac081a745dc616a5eb13ae864865fa2:/docs/latex/wx/snglinst.tex?ds=sidebyside

diff --git a/docs/latex/wx/snglinst.tex b/docs/latex/wx/snglinst.tex
index 98ffe82ff0..89d874b1b6 100644
--- a/docs/latex/wx/snglinst.tex
+++ b/docs/latex/wx/snglinst.tex
@@ -52,8 +52,6 @@ system call only.
 
 No base class
 
-\wxheading{Data structures}
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxSingleInstanceChecker::wxSingleInstanceChecker}\label{wxsingleinstancecheckerctor}
@@ -80,13 +78,13 @@ had been used is an error.
 
 \wxheading{Parameters}
 
-\docparam{name}{must be given and be as unique as possible, it is used as the
+\docparam{name}{must be given and be as unique as possible. It is used as the
 mutex name under Win32 and the lock file name under Unix. 
 \helpref{GetAppName()}{wxappgetappname} may be a good value for this parameter}
 
 \docparam{path}{is optional and is ignored under Win32 and used as the directory to
 create the lock file in under Unix (default is 
-\helpref{wxGetHomeDir()}{wxgethomedir})
+\helpref{wxGetHomeDir()}{wxgethomedir})}
 
 \wxheading{Return value}
 
