X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/684761db46d96d4a919d8e94edd1e9065978e675..fe161a2685012cf90bb5bfe95f2260aee71d8ad7:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index c42b8db335..89e56d46bc 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -35,7 +35,6 @@ application windows.
 \twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{Stay on top of all other windows,
 see also wxFRAME\_FLOAT\_ON\_PARENT. Windows only.}
 \twocolitem{\windowstyle{wxSYSTEM\_MENU}}{Displays a system menu.}
-\twocolitem{\windowstyle{wxSIMPLE\_BORDER}}{Displays no border or decorations. GTK and Windows only.}
 \twocolitem{\windowstyle{wxRESIZE\_BORDER}}{Displays a resizeable border around the window.}
 \twocolitem{\windowstyle{wxFRAME\_TOOL\_WINDOW}}{Causes a frame with a small
 titlebar to be created; the frame does not appear in the taskbar under Windows.}
@@ -48,13 +47,13 @@ Has no effect under other platforms.}
 on top of its parent (unlike wxSTAY\_ON\_TOP). A frame created with this style
 must have a non-NULL parent.}
 \twocolitem{\windowstyle{wxFRAME\_EX\_CONTEXTHELP}}{Under Windows, puts a query button on the
-caption. When pressed, Windows will go into a context-sensitive help mode and wxWindows will send
+caption. When pressed, Windows will go into a context-sensitive help mode and wxWidgets will send
 a wxEVT\_HELP event if the user clicked on an application window. {\it Note} that this is an extended
 style and must be set by calling \helpref{SetExtraStyle}{wxwindowsetextrastyle} before Create is called (two-step construction).
 You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX, so
-you should use
-{\tt wxDEFAULT\_FRAME\_STYLE \& (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
-frames having this style (the dialogs don't have minimize nor maximize box by
+you should use\rtfsp
+{\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
+frames having this style (the dialogs don't have a minimize or a maximize box by
 default)}
 \twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
   allowed to have their shape changed with the \helpref{SetShape}{wxframesetshape} method.}
@@ -62,7 +61,7 @@ default)}
 
 The default frame style is for normal, resizeable frames. To create a frame
 which can not be resized by user, you may use the following combination of
-styles: {\tt wxDEFAULT\_FRAME\_STYLE \& (wxRESIZE\_BORDER \pipe wxRESIZE\_BOX \pipe wxMAXIMIZE\_BOX)}.
+styles: {\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxRESIZE\_BORDER \pipe wxRESIZE\_BOX \pipe wxMAXIMIZE\_BOX)}.
 % Note: the space after the tilde is necessary or Tex2RTF complains.
 
 See also \helpref{window styles overview}{windowstyles}.
@@ -118,10 +117,10 @@ always be displayed on top of the parent window on Windows.}
 \docparam{title}{The caption to be displayed on the frame's title bar.}
 
 \docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxFrame}{wxframe}.}
 
@@ -191,7 +190,7 @@ value greater than 1 to create a multi-field status bar.}
 of valid styles.}
 
 \docparam{id}{The status bar window identifier. If -1, an identifier will be chosen by
-wxWindows.}
+wxWidgets.}
 
 \docparam{name}{The status bar window name.}
 
@@ -228,7 +227,7 @@ Creates a toolbar at the top or left of the frame.
 of valid styles.}
 
 \docparam{id}{The toolbar window identifier. If -1, an identifier will be chosen by
-wxWindows.}
+wxWidgets.}
 
 \docparam{name}{The toolbar window name.}
 
@@ -378,7 +377,7 @@ Virtual function called when a status bar is requested by \helpref{wxFrame::Crea
 of valid styles.}
 
 \docparam{id}{The window identifier. If -1, an identifier will be chosen by
-wxWindows.}
+wxWidgets.}
 
 \docparam{name}{The window name.}
 
@@ -408,7 +407,7 @@ Virtual function called when a toolbar is requested by \helpref{wxFrame::CreateT
 of valid styles.}
 
 \docparam{id}{The toolbar window identifier. If -1, an identifier will be chosen by
-wxWindows.}
+wxWidgets.}
 
 \docparam{name}{The toolbar window name.}
 
@@ -493,7 +492,7 @@ See also \helpref{wxIconBundle}{wxiconbundle}.
 %\end{verbatim}
 %
 %You can replace std.ico, mdi.ico and child.ico with your own defaults
-%for all your wxWindows application. Currently they show the same icon.
+%for all your wxWidgets application. Currently they show the same icon.
 
 \membersection{wxFrame::SetMenuBar}\label{wxframesetmenubar}
 
@@ -526,10 +525,10 @@ Note that on some platforms, it is not possible to call this function twice for
 \func{bool}{SetShape}{\param{const wxRegion\&}{ region}}
 
 If the platform supports it, sets the shape of the window to that
-depicted by \it{region}.  The system will not display or
+depicted by {\it{region}}.  The system will not display or
 respond to any mouse event for the pixels that lie outside of the
 region.  To reset the window to the normal rectangular shape simply
-call \it{SetShape} again with an empty region.  Returns TRUE if the
+call {\it{SetShape}} again with an empty region.  Returns TRUE if the
 operation is successful.
 
 \membersection{wxFrame::SetStatusBar}\label{wxframesetstatusbar}
