X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/684761db46d96d4a919d8e94edd1e9065978e675..1c0f361be288df133c766e04cc857b3e4682b31a:/docs/latex/wx/threadh.tex?ds=sidebyside

diff --git a/docs/latex/wx/threadh.tex b/docs/latex/wx/threadh.tex
index cc34b56e60..34b5c0f60b 100644
--- a/docs/latex/wx/threadh.tex
+++ b/docs/latex/wx/threadh.tex
@@ -36,7 +36,7 @@ None.
 
 \wxheading{See also}
 
-\helpref{wxThread}{wxthread}, \helpref{wxThreadHelperThread}{wxthreadhelperthread}
+\helpref{wxThread}{wxthread}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -89,7 +89,7 @@ The returned value is the thread exit code which is only useful for
 joinable threads and is the value returned by
 \helpref{GetThread()->Wait()}{wxthreadwait}.
 
-This function is called by wxWindows itself and should never be called
+This function is called by wxWidgets itself and should never be called
 directly.
 
 \membersection{wxThreadHelper::GetThread}\label{wxthreadhelpergetthread}
