X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/684761db46d96d4a919d8e94edd1e9065978e675..0b40f3d80b78cfbcce1927a684239bfe8d37fe58:/docs/latex/wx/vlbox.tex?ds=inline

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index f6a58463d1..d89098dd5c 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -129,7 +129,7 @@ Get the number of items in the control.
 \constfunc{wxPoint}{GetMargins}{\void}
 
 Returns the margins used by the control. The {\tt x} field of the returned
-point is the horizontal margine and the {\tt y} field is the vertical one.
+point is the horizontal margin and the {\tt y} field is the vertical one.
 
 \wxheading{See also}
 
