X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/677eff077ec0e0fbdda61f4e5e7c186e21c4fc47..63779a3de18f273c04247d74cee65f2bc6baa8ba:/docs/latex/wx/stopwtch.tex?ds=inline

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 148993136e..1f756a493f 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -17,15 +17,19 @@ use it to measure the time elapsed by some function:
 
 \wxheading{Include files}
 
-<wx/timer.h>
+<wx/stopwatch.h>
+
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
 
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxTimer}{wxtimer}
+\helpref{wxTimer}{wxtimer}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxStopWatch::wxStopWatch}
+\membersection{wxStopWatch::wxStopWatch}\label{wxstopwatchctor}
 
 \func{}{wxStopWatch}{\void}
 
@@ -55,9 +59,9 @@ Resumes the stop watch which had been paused with
 
 (Re)starts the stop watch with a given initial value.
 
-\membersection{wxStopWatch::Time}
+\membersection{wxStopWatch::Time}\label{wxstopwatchtime}
 
-\func{long}{Time}{\void}\label{wxstopwatchtime}
+\constfunc{long}{Time}{\void}\label{wxstopwatchtime}
 
 Returns the time in milliseconds since the start (or restart) or the last call of 
 \helpref{wxStopWatch::Pause}{wxstopwatchpause}.
