X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/677eff077ec0e0fbdda61f4e5e7c186e21c4fc47..3ac7b44cc0765b8444324d71b58cf648009d41c2:/docs/latex/wx/stopwtch.tex?ds=sidebyside

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 148993136e..473f4ec299 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -57,7 +57,7 @@ Resumes the stop watch which had been paused with
 
 \membersection{wxStopWatch::Time}
 
-\func{long}{Time}{\void}\label{wxstopwatchtime}
+\constfunc{long}{Time}{\void}\label{wxstopwatchtime}
 
 Returns the time in milliseconds since the start (or restart) or the last call of 
 \helpref{wxStopWatch::Pause}{wxstopwatchpause}.
