X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6774a5d35508ab4fff8ecacf30b29a07cf69cb78..5a20d2ced0a0779b5d8b1cc8064f8404b2727e92:/docs/latex/wx/regkey.tex

diff --git a/docs/latex/wx/regkey.tex b/docs/latex/wx/regkey.tex
index 6b08425ab2..f5853a10a3 100644
--- a/docs/latex/wx/regkey.tex
+++ b/docs/latex/wx/regkey.tex
@@ -144,7 +144,7 @@ Gets the name of the registry key.
 
 \membersection{wxRegKey::GetFirstKey}\label{wxregkeygetfirstkey}
 
-\func{bool}{GetKeyValue}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
+\func{bool}{GetFirstKey}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
 
 Gets the first key.
 
@@ -265,5 +265,10 @@ Renames a value.
 
 \func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{long}{ lValue}}
 
-Sets the numeric value.
+\func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{const wxString\&}{ strValue}}
+
+\func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{const wxMemoryBuffer\&}{ buf}}
+
+Sets the given \arg{szValue} which must be numeric, string or binary depending
+on the overload used. If the value doesn't exist, it is created.
 
