X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/6774a5d35508ab4fff8ecacf30b29a07cf69cb78..32013b47d64e648373eed7b522f2bf2880aa2f64:/docs/latex/wx/regkey.tex

diff --git a/docs/latex/wx/regkey.tex b/docs/latex/wx/regkey.tex
index 6b08425ab2..20519cd3fc 100644
--- a/docs/latex/wx/regkey.tex
+++ b/docs/latex/wx/regkey.tex
@@ -44,6 +44,10 @@ None
 
 <wx/msw/registry.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Example}
 
 \begin{verbatim}
@@ -144,7 +148,7 @@ Gets the name of the registry key.
 
 \membersection{wxRegKey::GetFirstKey}\label{wxregkeygetfirstkey}
 
-\func{bool}{GetKeyValue}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
+\func{bool}{GetFirstKey}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
 
 Gets the first key.
 
@@ -158,7 +162,7 @@ Gets the first value of this key.
 
 \membersection{wxRegKey::GetKeyInfo}\label{wxregkeygetkeyinfo}
 
-\constfunc{bool}{Exists}{\param{size\_t *}{pnSubKeys}, \param{size\_t *}{pnValues}, \param{size\_t *}{pnMaxValueLen}}
+\constfunc{bool}{GetKeyInfo}{\param{size\_t *}{pnSubKeys}, \param{size\_t *}{pnValues}, \param{size\_t *}{pnMaxValueLen}}
 
 Gets information about the key.
 
@@ -170,6 +174,8 @@ Gets information about the key.
 
 \docparam{pnValues}{The number of values.}
 
+\docparam{pnMaxValueLen}{The maximum length of a value.}
+
 
 \membersection{wxRegKey::GetNextKey}\label{wxregkeygetnextkey}
 
@@ -265,5 +271,10 @@ Renames a value.
 
 \func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{long}{ lValue}}
 
-Sets the numeric value.
+\func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{const wxString\&}{ strValue}}
+
+\func{bool}{SetValue}{\param{const wxChar *}{szValue}, \param{const wxMemoryBuffer\&}{ buf}}
+
+Sets the given \arg{szValue} which must be numeric, string or binary depending
+on the overload used. If the value doesn't exist, it is created.
 
