X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/67598dc41c16673893553f83cb0cf05f10a41ece..78cd9c69eb3f4c158fe10ce49325d57ec05d1306:/docs/latex/wx/datectrl.tex?ds=sidebyside

diff --git a/docs/latex/wx/datectrl.tex b/docs/latex/wx/datectrl.tex
index d2ad8999a3..09c2f933aa 100644
--- a/docs/latex/wx/datectrl.tex
+++ b/docs/latex/wx/datectrl.tex
@@ -30,6 +30,10 @@ It is only available if \texttt{wxUSE\_DATEPICKCTRL} is set to $1$.
 
 <wx/datectrl.h>
 
+\wxheading{Library}
+
+\helpref{wxAdv}{librarieslist}
+
 (only available if \texttt{wxUSE\_DATEPICKCTRL} is set to $1$)
 
 \wxheading{Window styles}
@@ -150,6 +154,21 @@ set.
 Returns the currently selected. If there is no selection or the selection is
 outside of the current range, an invalid object is returned.
 
+\membersection{wxDatePickerCtrl::SetFormat}\label{wxdatepickerctrlsetformat}
+
+\func{void}{SetFormat}{\param{const wxChar*}{ format}}
+
+Please note that this function is only available in the generic version of this
+control. The native version always uses the current system locale.
+
+Sets the display format for the date in the control. See wxDateTime for the
+meaning of format strings.
+
+\wxheading{Remarks}
+
+If the format parameter is invalid,
+the behaviour is undefined.
+
 
 \membersection{wxDatePickerCtrl::SetRange}\label{wxdatepickerctrlsetrange}
 
