X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/66f55ec64c250fc51147815bf905a86e943bfd16..94e2ed3b8db0220160c0b939782cd46914ec073a:/docs/latex/wx/process.tex?ds=sidebyside

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 4aa9a8df23..2994063100 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -1,6 +1,6 @@
 \section{\class{wxProcess}}\label{wxprocess}
 
-The objects of this class are used in conjunction with 
+The objects of this class are used in conjunction with the 
 \helpref{wxExecute}{wxexecute} function. When a wxProcess object is passed to
 wxExecute(), its \helpref{OnTerminate()}{wxprocessonterminate} virtual method
 is called when the process terminates. This allows the program to be
@@ -14,6 +14,15 @@ However, if it is not processed, the object will delete itself and so the
 library users should only delete those objects whose notifications have been
 processed (and call \helpref{Detach()}{wxprocessdetach} for others).
 
+wxProcess also supports IO redirection of the child process. For this, you have
+to call its \helpref{Redirect}{wxprocessredirect} method before passing it to 
+\helpref{wxExecute}{wxexecute}. If the child process was launched successfully, 
+\helpref{GetInputStream}{wxprocessgetinputstream}, 
+\helpref{GetOutputStream}{wxprocessgetoutputstream} and 
+\helpref{GetErrorStream}{wxprocessgeterrorstream} can then be used to retrieve
+the streams corresponding to the child process stdandard output, input and
+error output respectively.
+
 \wxheading{Derived from}
 
 \helpref{wxEvtHandler}{wxevthandler}
@@ -22,6 +31,11 @@ processed (and call \helpref{Detach()}{wxprocessdetach} for others).
 
 <wx/process.h>
 
+\wxheading{See also}
+
+\helpref{wxExecute}{wxexecute}\\
+\helpref{exec sample}{sampleexec}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxProcess::wxProcess}\label{wxprocessconstr}
@@ -48,6 +62,15 @@ macro in the event table of the parent to handle it) with the given {\it id}.
 
 Destroys the wxProcess object.
 
+\membersection{wxProcess::CloseOutput}\label{wxprocesscloseoutput}
+
+\func{void}{CloseOutput}{\void}
+
+Closes the output stream (the one connected to the stdin of the child
+process). This function can be used to indicate to the child process that
+there is no more data to be read - usually, a filter program will only
+terminate when the input stream is closed.
+
 \membersection{wxProcess::Detach}\label{wxprocessdetach}
 
 \func{void}{Detach}{\void}
@@ -62,28 +85,97 @@ from its parent, no notification events will be sent to the parent and the
 object will delete itself upon reception of the process termination
 notification.
 
+\membersection{wxProcess::GetErrorStream}\label{wxprocessgeterrorstream}
+
+\constfunc{wxInputStream* }{GetErrorStream}{\void}
+
+Returns an input stream which corresponds to the standard error output (stderr)
+of the child process.
+
 \membersection{wxProcess::GetInputStream}\label{wxprocessgetinputstream}
 
 \constfunc{wxInputStream* }{GetInputStream}{\void}
 
-It returns a output stream corresponding to the input stream of the subprocess. 
-If it is NULL, you have not turned on the redirection.
+It returns an input stream corresponding to the standard output stream of the
+subprocess. If it is NULL, you have not turned on the redirection.
 See \helpref{wxProcess::Redirect}{wxprocessredirect}.
 
 \membersection{wxProcess::GetOutputStream}\label{wxprocessgetoutputstream}
 
 \constfunc{wxOutputStream* }{GetOutputStream}{\void}
 
-It returns an output stream correspoding to the output stream of the subprocess.
+It returns an output stream correspoding to the input stream of the subprocess.
 If it is NULL, you have not turned on the redirection.
 See \helpref{wxProcess::Redirect}{wxprocessredirect}.
 
+\membersection{wxProcess::Kill}\label{wxprocesskill}
+
+\func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}}
+
+Send the specified signal to the given process. Possible signal values are:
+
+\begin{verbatim}
+enum wxSignal
+{
+    wxSIGNONE = 0,  // verify if the process exists under Unix
+    wxSIGHUP,
+    wxSIGINT,
+    wxSIGQUIT,
+    wxSIGILL,
+    wxSIGTRAP,
+    wxSIGABRT,
+    wxSIGEMT,
+    wxSIGFPE,
+    wxSIGKILL,      // forcefully kill, dangerous!
+    wxSIGBUS,
+    wxSIGSEGV,
+    wxSIGSYS,
+    wxSIGPIPE,
+    wxSIGALRM,
+    wxSIGTERM       // terminate the process gently
+};
+\end{verbatim}
+
+{\tt wxSIGNONE}, {\tt wxSIGKILL} and {\tt wxSIGTERM} have the same meaning
+under both Unix and Windows but all the other signals are equivalent to 
+{\tt wxSIGTERM} under Windows.
+
+Returns the element of {\tt wxKillError} enum:
+
+\begin{verbatim}
+enum wxKillError
+{
+    wxKILL_OK,              // no error
+    wxKILL_BAD_SIGNAL,      // no such signal
+    wxKILL_ACCESS_DENIED,   // permission denied
+    wxKILL_NO_PROCESS,      // no such process
+    wxKILL_ERROR            // another, unspecified error
+};
+\end{verbatim}
+
+\wxheading{See also}
+
+\helpref{wxProcess::Exists}{wxprocessexists},\rtfsp
+\helpref{wxKill}{wxkill},\rtfsp
+\helpref{Exec sample}{sampleexec}
+
+\membersection{wxProcess::Kill}\label{wxprocessexists}
+
+\func{static bool}{Exists}{\param{int}{ pid}}
+
+Returns {\tt TRUE} if the given process exists in the system.
+
+\wxheading{See also}
+
+\helpref{wxProcess::Kill}{wxprocesskill},\rtfsp
+\helpref{Exec sample}{sampleexec}
+
 \membersection{wxProcess::OnTerminate}\label{wxprocessonterminate}
 
 \constfunc{void}{OnTerminate}{\param{int}{ pid}, \param{int}{ status}}
 
 It is called when the process with the pid {\it pid} finishes.
-It raises a wxWindows event when it isn't overriden.
+It raises a wxWindows event when it isn't overridden.
 
 \docparam{pid}{The pid of the process which has just terminated.}
 
@@ -93,7 +185,7 @@ It raises a wxWindows event when it isn't overriden.
 
 \func{void}{Redirect}{\void}
 
-It turns on the redirection, wxExecute will try to open a couple of pipes
+Turns on redirection. wxExecute will try to open a couple of pipes
 to catch the subprocess stdio. The caught input stream is returned by
 GetOutputStream() as a non-seekable stream. The caught output stream is returned
 by GetInputStream() as a non-seekable stream.
