X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/65e508482777277c429b8c522e1ff8050ff5cdc7..762e199741e236841278dfa6c08a7a0ca376252e:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index c0daf6f9ed..6b1ddc01d0 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -320,6 +320,13 @@ will change the visible state of the tool to indicate that it is disabled.
 \helpref{wxToolBar::GetToolEnabled}{wxtoolbargettoolenabled},\rtfsp
 \helpref{wxToolBar::ToggleTool}{wxtoolbartoggletool}
 
+\membersection{wxToolBar::FindControl}\label{wxtoolbarfindcontrol}
+
+\func{wxControl*}{FindControl}{\param{int }{id}}
+
+Returns a pointer to the control identified by {\it id} or
+NULL if no corresponding control is found.
+
 \membersection{wxToolBar::FindToolForPosition}\label{wxtoolbarfindtoolforposition}
 
 \constfunc{wxToolBarTool*}{FindToolForPosition}{\param{const float}{ x}, \param{const float}{ y}}
