X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/65e508482777277c429b8c522e1ff8050ff5cdc7..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index c0daf6f9ed..bb7f8ada0b 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -6,15 +6,8 @@ The name wxToolBar is defined to be a synonym for one of the following classes:
 \item {\bf wxToolBar95} The native Windows 95 toolbar. Used on Windows 95, NT 4 and above.
 \item {\bf wxToolBarMSW} A Windows implementation. Used on 16-bit Windows.
 \item {\bf wxToolBarGTK} The GTK toolbar.
-\item {\bf wxToolBarSimple} A simple implementation, with scrolling.
-Used on platforms with no native toolbar control, or where scrolling is required.
 \end{itemize}
 
-Note that the base class {\bf wxToolBarBase} defines
-automatic scrolling management functionality which is similar
-to \helpref{wxScrolledWindow}{wxscrolledwindow}, so please refer to this class also.
-Not all toolbars support scrolling, but wxToolBarSimple does.
-
 \wxheading{Derived from}
 
 wxToolBarBase\\
@@ -25,38 +18,62 @@ wxToolBarBase\\
 
 \wxheading{Include files}
 
-<wx/toolbar.h> (to allow wxWindows to select an appropriate toolbar class)\\
-<wx/tbarbase.h> (the base class)\\
-<wx/tbarmsw.h> (the non-Windows 95 Windows toolbar class)\\
-<wx/tbar95.h> (the Windows 95/98 toolbar class)\\
-<wx/tbarsmpl.h> (the generic simple toolbar class)
+<wx/toolbar.h> (to allow wxWidgets to select an appropriate toolbar class)\\
+<wx/tbarbase.h> (the base class)
 
 \wxheading{Remarks}
 
 You may also create a toolbar that is managed by the frame, by
-calling \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}.
+calling \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}. Under Pocket PC,
+you should \arg{always} use this function for creating the toolbar
+to be managed by the frame, so that wxWidgets can use a combined
+menubar and toolbar. Where you manage your own toolbars, create a wxToolBar
+as usual.
+
+The meaning of a "separator" is a vertical line under Windows and simple space under GTK+.
+
+{\bf wxToolBar95:} Note that this toolbar paints tools to reflect system-wide colours.
+If you use more than 16 colours in your tool bitmaps, you may wish to suppress
+this behaviour, otherwise system colours in your bitmaps will inadvertently be
+mapped to system colours. To do this, set the {\tt msw.remap} system option
+before creating the toolbar:
+
+\begin{verbatim}
+  wxSystemOptions::SetOption(wxT("msw.remap"), 0);
+\end{verbatim}
+
+If you wish to use 32-bit images (which include an alpha channel for transparency)
+use:
 
-Due to the use of native toolbars on the various platforms, certain adaptions will
-often have to be made in order to get optimal look on all platforms as some platforms
-ignore the values for explicit placement and use their own layout and the meaning
-of a "separator" is a vertical line under Windows95 vs. simple space under GTK etc.
+\begin{verbatim}
+  wxSystemOptions::SetOption(wxT("msw.remap"), 2);
+\end{verbatim}
 
-{\bf wxToolBar95:} Note that this toolbar paints tools to reflect user-selected colours.
+then colour remapping is switched off, and a transparent background used. But only
+use this option under Windows XP with true colour:
+
+\begin{verbatim}
+  (wxTheApp->GetComCtl32Version() >= 600 && ::wxDisplayDepth() >= 32)
+\end{verbatim}
 
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxTB\_FLAT}}{Gives the toolbar a flat look ('coolbar' or 'flatbar' style). Windows 95 and GTK 1.2 only.}
-\twocolitem{\windowstyle{wxTB\_DOCKABLE}}{Makes the toolbar floatable and dockable. GTK only.}
-\twocolitem{\windowstyle{wxTB\_HORIZONTAL}}{Specifies horizontal layout.}
-\twocolitem{\windowstyle{wxTB\_VERTICAL}}{Specifies vertical layout (not available for the GTK and Windows 95
-toolbar).}
-\twocolitem{\windowstyle{wxTB\_3DBUTTONS}}{Gives wxToolBarSimple a mild 3D look to its buttons.}
-\twocolitem{\windowstyle{wxTB\_TEXT}}{Show the text in the toolbar buttons; by default only icons are shown.}
+\twocolitem{\windowstyle{wxTB\_FLAT}}{Gives the toolbar a flat look (Windows and GTK only).}
+\twocolitem{\windowstyle{wxTB\_DOCKABLE}}{Makes the toolbar floatable and dockable (GTK only).}
+\twocolitem{\windowstyle{wxTB\_HORIZONTAL}}{Specifies horizontal layout (default).}
+\twocolitem{\windowstyle{wxTB\_VERTICAL}}{Specifies vertical layout.}
+\twocolitem{\windowstyle{wxTB\_TEXT}}{Shows the text in the toolbar buttons; by default only icons are shown.}
 \twocolitem{\windowstyle{wxTB\_NOICONS}}{Specifies no icons in the toolbar buttons; by default they are shown.}
-\twocolitem{\windowstyle{wxTB\_NODIVIDER}}{Specifies no divider above the toolbar; by default it is shown. Windows only.}
-\twocolitem{\windowstyle{wxTB\_NOALIGN}}{Specifies no alignment with the parent window. Windows only.}
+\twocolitem{\windowstyle{wxTB\_NODIVIDER}}{Specifies no divider (border) above the toolbar (Windows only).}
+\twocolitem{\windowstyle{wxTB\_NOALIGN}}{Specifies no alignment with the parent window (Windows only, not very useful).}
+\twocolitem{\windowstyle{wxTB\_HORZ\_LAYOUT}}{Shows the text and the icons alongside, not vertically stacked (Windows and GTK
+2 only). This style must be used with wxTB\_TEXT.}
+\twocolitem{\windowstyle{wxTB\_HORZ\_TEXT}}{Combination of wxTB\_HORZ\_LAYOUT and wxTB\_TEXT.}
+\twocolitem{\windowstyle{wxTB\_NO\_TOOLTIPS}}{Don't show the short help tooltips for the tools when the mouse hovers over them.}
+\twocolitem{\windowstyle{wxTB\_BOTTOM}}{Align the toolbar at the bottom of parent window.}
+\twocolitem{\windowstyle{wxTB\_RIGHT}}{Align the toolbar at the right side of parent window.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}. Note that the Win32
@@ -65,36 +82,46 @@ native toolbar ignores {\tt wxTB\_NOICONS} style. Also, toggling the
 
 \wxheading{Event handling}
 
-The toolbar class emits menu commands in the same was that a frame menubar does,
+The toolbar class emits menu commands in the same way that a frame menubar does,
 so you can use one EVT\_MENU macro for both a menu item and a toolbar button.
 The event handler functions take a wxCommandEvent argument. For most event macros,
 the identifier of the tool is passed, but for EVT\_TOOL\_ENTER the toolbar
-window is passed and the tool id is retrieved from the wxCommandEvent.
-This is because the id may be -1 when the mouse moves off a tool, and -1 is not
+window identifier is passed and the tool identifier is retrieved from the wxCommandEvent.
+This is because the identifier may be -1 when the mouse moves off a tool, and -1 is not
 allowed as an identifier in the event system.
 
-Note that tool commands (and UI update events for tools) are first sent to
-the focus window within the frame that contains the toolbar. If no window within the frame has the focus,
-then the events are sent directly to the toolbar (and up the hierarchy to the
-frame, depending on where the application has put its event handlers). This allows command and UI update
-handling to be processed by specific windows and controls, and not necessarily
-by the application frame.
-
 \twocolwidtha{7cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{{\bf EVT\_TOOL(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_CLICKED event
 (a synonym for wxEVT\_COMMAND\_MENU\_SELECTED). Pass the id of the tool.}
 \twocolitem{{\bf EVT\_MENU(id, func)}}{The same as EVT\_TOOL.}
 \twocolitem{{\bf EVT\_TOOL\_RANGE(id1, id2, func)}}{Process a wxEVT\_COMMAND\_TOOL\_CLICKED event
-for a range id identifiers. Pass the ids of the tools.}
+for a range of identifiers. Pass the ids of the tools.}
 \twocolitem{{\bf EVT\_MENU\_RANGE(id1, id2, func)}}{The same as EVT\_TOOL\_RANGE.}
-
 \twocolitem{{\bf EVT\_TOOL\_RCLICKED(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_RCLICKED event.
 Pass the id of the tool.}
 \twocolitem{{\bf EVT\_TOOL\_RCLICKED\_RANGE(id1, id2, func)}}{Process a wxEVT\_COMMAND\_TOOL\_RCLICKED event
 for a range of ids. Pass the ids of the tools.}
 \twocolitem{{\bf EVT\_TOOL\_ENTER(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_ENTER event.
 Pass the id of the toolbar itself. The value of wxCommandEvent::GetSelection is the tool id, or -1 if the mouse cursor has moved off a tool.}
+\twocolitem{{\bf EVT\_TOOL\_DROPDOWN(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_DROPDOWN\_CLICKED event. If unhandled, displays the default dropdown menu set using \helpref{wxToolBar::SetDropdownMenu}{wxtoolbarsetdropdownmenu}.}
+\end{twocollist}
+
+\wxheading{wxItemKind}
+
+There are several different types of tools you can add to a toolbar. These
+types are controlled by the wxItemKind enumeration which has the following
+values:
+\twocolwidtha{5cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxITEM\_NORMAL}}{Normal tool button}
+\twocolitem{{\bf wxITEM\_CHECK}}{Check (or toggle) tool button.}
+\twocolitem{{\bf wxITEM\_NORMAL}}{Radio tool button. See \helpref{wxToolBar::AddRadioTool}{wxtoolbaraddradiotool} for details}
+\twocolitem{{\bf wxITEM\_DROPDOWN}}{Normal tool button with a dropdown arrow
+next to it. Clicking the dropdown arrow sends a wxEVT\_COMMAND\_TOOL\_DROPDOWN\_CLICKED
+event and may also display the menu previously associated with the item with 
+\helpref{wxToolBar::SetDropdownMenu}{wxtoolbarsetdropdownmenu}. Currently this
+type of tools is supported under MSW and GTK.}
 \end{twocollist}
 
 \wxheading{See also}
@@ -104,6 +131,7 @@ Pass the id of the toolbar itself. The value of wxCommandEvent::GetSelection is
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
+
 \membersection{wxToolBar::wxToolBar}\label{wxtoolbarconstr}
 
 \func{}{wxToolBar}{\void}
@@ -113,7 +141,7 @@ Default constructor.
 \func{}{wxToolBar}{\param{wxWindow*}{ parent}, \param{wxWindowID }{id},
  \param{const wxPoint\& }{pos = wxDefaultPosition},
  \param{const wxSize\& }{size = wxDefaultSize},
- \param{long }{style = wxTB\_HORIZONTAL \pipe wxNO\_BORDER},
+ \param{long }{style = wxTB\_HORIZONTAL \pipe wxBORDER\_NONE},
  \param{const wxString\& }{name = wxPanelNameStr}}
 
 Constructs a toolbar.
@@ -124,11 +152,11 @@ Constructs a toolbar.
 
 \docparam{id}{Window identifier. If -1, will automatically create an identifier.}
 
-\docparam{pos}{Window position. wxDefaultPosition is (-1, -1) which indicates that wxWindows
+\docparam{pos}{Window position. wxDefaultPosition is (-1, -1) which indicates that wxWidgets
 should generate a default position for the window. If using the wxWindow class directly, supply
 an actual position.}
 
-\docparam{size}{Window size. wxDefaultSize is (-1, -1) which indicates that wxWindows
+\docparam{size}{Window size. wxDefaultSize is (-1, -1) which indicates that wxWidgets
 should generate a default size for the window.}
 
 \docparam{style}{Window style. See \helpref{wxToolBar}{wxtoolbar} for details.}
@@ -145,20 +173,31 @@ tools.
 You may also create a toolbar that is managed by the frame, by
 calling \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}.
 
-\membersection{wxToolBar::\destruct{wxToolBar}}
+
+\membersection{wxToolBar::\destruct{wxToolBar}}\label{wxtoolbardtor}
 
 \func{void}{\destruct{wxToolBar}}{\void}
 
 Toolbar destructor.
 
+
 \membersection{wxToolBar::AddControl}\label{wxtoolbaraddcontrol}
 
-\func{bool}{AddControl}{\param{wxControl*}{ control}}
+\func{bool}{AddControl}{\param{wxControl*}{ control}, \param{const wxString&}{ label = ""}}
 
 Adds any control to the toolbar, typically e.g. a combobox.
 
 \docparam{control}{The control to be added.}
 
+\docparam{label}{Text to be displayed near the control.}
+
+\wxheading{Remarks}
+
+wxMSW: the label is only displayed if there is enough space available below the embedded control.
+
+wxMac: labels are only displayed if wxWidgets is built with wxMAC\_USE\_NATIVE\_TOOLBAR set to 1
+
+
 \membersection{wxToolBar::AddSeparator}\label{wxtoolbaraddseparator}
 
 \func{void}{AddSeparator}{\void}
@@ -169,26 +208,30 @@ Adds a separator for spacing groups of tools.
 
 \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}, \helpref{wxToolBar::SetToolSeparation}{wxtoolbarsettoolseparation}
 
+
 \membersection{wxToolBar::AddTool}\label{wxtoolbaraddtool}
 
-\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId},\rtfsp
+\func{wxToolBarToolBase*}{AddTool}{\param{int}{ toolId},\rtfsp
 \param{const wxString\&}{ label},\rtfsp
 \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxString\& }{shortHelpString = ""},\rtfsp
 \param{wxItemKind}{ kind = wxITEM\_NORMAL}}
 
-\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId},\rtfsp
+\func{wxToolBarToolBase*}{AddTool}{\param{int}{ toolId},\rtfsp
 \param{const wxString\&}{ label},\rtfsp
 \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2 = wxNullBitmap},\rtfsp
 \param{wxItemKind}{ kind = wxITEM\_NORMAL},\rtfsp
 \param{const wxString\& }{shortHelpString = ""},
 \param{const wxString\& }{longHelpString = ""},\rtfsp
-\param{wxObject* }{clientData = NULL}}
+\param{wxObject* }{clientData = \NULL}}
+
+\func{wxToolBarToolBase*}{AddTool}{\param{wxToolBarToolBase* }{tool}}
 
 Adds a tool to the toolbar. The first (short and most commonly used) version
 has fewer parameters than the full version at the price of not being able to
-specify some of the more rarely used button features.
+specify some of the more rarely used button features. The last version allows
+you to add an existing tool.
 
 \wxheading{Parameters}
 
@@ -201,13 +244,11 @@ toggled) or wxITEM\_RADIO for a checkable tool which makes part of a radio
 group of tools each of which is automatically unchecked whenever another button
 in the group is checked}
 
-\docparam{bitmap1}{The primary tool bitmap for toggle and button tools.}
+\docparam{bitmap1}{The primary tool bitmap.}
 
-\docparam{bitmap2}{The second bitmap specifies the on-state bitmap for a toggle
-tool. If this is wxNullBitmap, either an inverted version of the primary bitmap is
-used for the on-state of a toggle tool (monochrome displays) or a black
-border is drawn around the tool (colour displays) or the pixmap is shown
-as a pressed button (GTK). }
+\docparam{bitmap2}{The bitmap used when the tool is disabled. If it is equal to
+wxNullBitmap, the disabled bitmap is automatically generated by greing the
+normal one.}
 
 \docparam{shortHelpString}{This string is used for the tools tooltip}
 
@@ -217,6 +258,8 @@ parent frame when the mouse pointer is inside the tool}
 \docparam{clientData}{An optional pointer to client data which can be
 retrieved later using \helpref{wxToolBar::GetToolClientData}{wxtoolbargettoolclientdata}.}
 
+\docparam{tool}{The tool to be added.}
+
 \wxheading{Remarks}
 
 After you have added tools to a toolbar, you must call \helpref{wxToolBar::Realize}{wxtoolbarrealize} in
@@ -231,15 +274,16 @@ order to have the tools appear.
 \helpref{wxToolBar::DeleteTool}{wxtoolbardeletetool},\rtfsp
 \helpref{wxToolBar::Realize}{wxtoolbarrealize}
 
+
 \membersection{wxToolBar::AddCheckTool}\label{wxtoolbaraddchecktool}
 
-\func{wxToolBarTool*}{AddCheckTool}{\param{int}{ toolId},\rtfsp
+\func{wxToolBarToolBase*}{AddCheckTool}{\param{int}{ toolId},\rtfsp
 \param{const wxString\&}{ label},\rtfsp
 \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2},\rtfsp
 \param{const wxString\& }{shortHelpString = ""},\rtfsp
 \param{const wxString\& }{longHelpString = ""},\rtfsp
-\param{wxObject* }{clientData = NULL}}
+\param{wxObject* }{clientData = \NULL}}
 
 Adds a new check (or toggle) tool to the toolbar. The parameters are the same
 as in \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.
@@ -248,15 +292,16 @@ as in \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.
 
 \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}
 
+
 \membersection{wxToolBar::AddRadioTool}\label{wxtoolbaraddradiotool}
 
-\func{wxToolBarTool*}{AddRadioTool}{\param{int}{ toolId},\rtfsp
+\func{wxToolBarToolBase*}{AddRadioTool}{\param{int}{ toolId},\rtfsp
 \param{const wxString\&}{ label},\rtfsp
 \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2},\rtfsp
 \param{const wxString\& }{shortHelpString = ""},\rtfsp
 \param{const wxString\& }{longHelpString = ""},\rtfsp
-\param{wxObject* }{clientData = NULL}}
+\param{wxObject* }{clientData = \NULL}}
 
 Adds a new radio tool to the toolbar. Consecutive radio tools form a radio
 group such that exactly one button in the group is pressed at any moment, in
@@ -271,6 +316,12 @@ others are not.
 
 \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}
 
+\membersection{wxToolBar::ClearTools}\label{wxtoolbarcleartools}
+
+\func{void}{ClearTools}{\void}
+
+Deletes all the tools in the toolbar.
+
 \membersection{wxToolBar::DeleteTool}\label{wxtoolbardeletetool}
 
 \func{bool}{DeleteTool}{\param{int }{toolId}}
@@ -282,12 +333,13 @@ back later), you may use \helpref{RemoveTool}{wxtoolbarremovetool} instead.
 Note that it is unnecessary to call \helpref{Realize}{wxtoolbarrealize} for the
 change to take place, it will happen immediately.
 
-Returns TRUE if the tool was deleted, FALSE otherwise.
+Returns true if the tool was deleted, false otherwise.
 
 \wxheading{See also}
 
 \helpref{DeleteToolByPos}{wxtoolbardeletetoolbypos}
 
+
 \membersection{wxToolBar::DeleteToolByPos}\label{wxtoolbardeletetoolbypos}
 
 \func{bool}{DeleteToolByPos}{\param{size\_t }{pos}}
@@ -295,9 +347,10 @@ Returns TRUE if the tool was deleted, FALSE otherwise.
 This function behaves like \helpref{DeleteTool}{wxtoolbardeletetool} but it
 deletes the tool at the specified position and not the one with the given id.
 
+
 \membersection{wxToolBar::EnableTool}\label{wxtoolbarenabletool}
 
-\func{void}{EnableTool}{\param{int }{toolId}, \param{const bool}{ enable}}
+\func{void}{EnableTool}{\param{int }{toolId}, \param{bool}{ enable}}
 
 Enables or disables the tool.
 
@@ -305,24 +358,40 @@ Enables or disables the tool.
 
 \docparam{toolId}{Tool to enable or disable.}
 
-\docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
+\docparam{enable}{If true, enables the tool, otherwise disables it.}
 
 {\bf NB:} This function should only be called after 
 \helpref{Realize}{wxtoolbarrealize}.
 
 \wxheading{Remarks}
 
-For wxToolBarSimple, does nothing. Some other implementations
-will change the visible state of the tool to indicate that it is disabled.
+Some implementations will change the visible state of the tool to indicate that it is disabled.
 
 \wxheading{See also}
 
 \helpref{wxToolBar::GetToolEnabled}{wxtoolbargettoolenabled},\rtfsp
 \helpref{wxToolBar::ToggleTool}{wxtoolbartoggletool}
 
+
+\membersection{wxToolBar::FindById}\label{wxtoolbarfindbyid}
+
+\func{wxToolBarToolBase*}{FindById}{\param{int }{id}}
+
+Returns a pointer to the tool identified by \arg{id} or
+\NULL if no corresponding tool is found.
+
+
+\membersection{wxToolBar::FindControl}\label{wxtoolbarfindcontrol}
+
+\func{wxControl*}{FindControl}{\param{int }{id}}
+
+Returns a pointer to the control identified by \arg{id} or 
+\NULL if no corresponding control is found.
+
+
 \membersection{wxToolBar::FindToolForPosition}\label{wxtoolbarfindtoolforposition}
 
-\constfunc{wxToolBarTool*}{FindToolForPosition}{\param{const float}{ x}, \param{const float}{ y}}
+\constfunc{wxToolBarToolBase*}{FindToolForPosition}{\param{wxCoord }{x}, \param{wxCoord }{y}}
 
 Finds a tool for the given mouse position.
 
@@ -334,11 +403,19 @@ Finds a tool for the given mouse position.
 
 \wxheading{Return value}
 
-A pointer to a tool if a tool is found, or NULL otherwise.
+A pointer to a tool if a tool is found, or \NULL otherwise.
 
 \wxheading{Remarks}
 
-Used internally, and should not need to be used by the programmer.
+Currently not implemented in wxGTK (always returns \NULL there).
+
+
+\membersection{wxToolBar::GetToolsCount}\label{wxtoolbargettoolscount}
+
+\constfunc{int}{GetToolsCount}{\void}
+
+Returns the number of tools in the toolbar.
+
 
 \membersection{wxToolBar::GetToolSize}\label{wxtoolbargettoolsize}
 
@@ -352,6 +429,7 @@ of added 3D effects.
 \helpref{wxToolBar::SetToolBitmapSize}{wxtoolbarsettoolbitmapsize},\rtfsp
 \helpref{wxToolBar::GetToolBitmapSize}{wxtoolbargettoolbitmapsize}
 
+
 \membersection{wxToolBar::GetToolBitmapSize}\label{wxtoolbargettoolbitmapsize}
 
 \func{wxSize}{GetToolBitmapSize}{\void}
@@ -368,6 +446,7 @@ and not the eventual size of the tool button.
 \helpref{wxToolBar::SetToolBitmapSize}{wxtoolbarsettoolbitmapsize},\rtfsp
 \helpref{wxToolBar::GetToolSize}{wxtoolbargettoolsize}
 
+
 \membersection{wxToolBar::GetMargins}\label{wxtoolbargetmargins}
 
 \constfunc{wxSize}{GetMargins}{\void}
@@ -378,6 +457,7 @@ Returns the left/right and top/bottom margins, which are also used for inter-too
 
 \helpref{wxToolBar::SetMargins}{wxtoolbarsetmargins}
 
+
 \membersection{wxToolBar::GetToolClientData}\label{wxtoolbargettoolclientdata}
 
 \constfunc{wxObject*}{GetToolClientData}{\param{int }{toolId}}
@@ -390,7 +470,8 @@ Get any client data associated with the tool.
 
 \wxheading{Return value}
 
-Client data, or NULL if there is none.
+Client data, or \NULL if there is none.
+
 
 \membersection{wxToolBar::GetToolEnabled}\label{wxtoolbargettoolenabled}
 
@@ -404,12 +485,13 @@ Called to determine whether a tool is enabled (responds to user input).
 
 \wxheading{Return value}
 
-TRUE if the tool is enabled, FALSE otherwise.
+true if the tool is enabled, false otherwise.
 
 \wxheading{See also}
 
 \helpref{wxToolBar::EnableTool}{wxtoolbarenabletool}
 
+
 \membersection{wxToolBar::GetToolLongHelp}\label{wxtoolbargettoollonghelp}
 
 \constfunc{wxString}{GetToolLongHelp}{\param{int }{toolId}}
@@ -425,6 +507,7 @@ Returns the long help for the given tool.
 \helpref{wxToolBar::SetToolLongHelp}{wxtoolbarsettoollonghelp},\rtfsp
 \helpref{wxToolBar::SetToolShortHelp}{wxtoolbarsettoolshorthelp}\rtfsp
 
+
 \membersection{wxToolBar::GetToolPacking}\label{wxtoolbargettoolpacking}
 
 \constfunc{int}{GetToolPacking}{\void}
@@ -435,6 +518,14 @@ Returns the value used for packing tools.
 
 \helpref{wxToolBar::SetToolPacking}{wxtoolbarsettoolpacking}
 
+
+\membersection{wxToolBar::GetToolPos}\label{wxtoolbargettoolpos}
+
+\constfunc{int}{GetToolPos}{\param{int }{toolId}}
+
+Returns the tool position in the toolbar, or {\tt wxNOT\_FOUND} if the tool is not found.
+
+
 \membersection{wxToolBar::GetToolSeparation}\label{wxtoolbargettoolseparation}
 
 \constfunc{int}{GetToolSeparation}{\void}
@@ -445,6 +536,7 @@ Returns the default separator size.
 
 \helpref{wxToolBar::SetToolSeparation}{wxtoolbarsettoolseparation}
 
+
 \membersection{wxToolBar::GetToolShortHelp}\label{wxtoolbargettoolshorthelp}
 
 \constfunc{wxString}{GetToolShortHelp}{\param{int }{toolId}}
@@ -460,6 +552,7 @@ Returns the short help for the given tool.
 \helpref{wxToolBar::GetToolLongHelp}{wxtoolbargettoollonghelp},\rtfsp
 \helpref{wxToolBar::SetToolShortHelp}{wxtoolbarsettoolshorthelp}\rtfsp
 
+
 \membersection{wxToolBar::GetToolState}\label{wxtoolbargettoolstate}
 
 \constfunc{bool}{GetToolState}{\param{int }{toolId}}
@@ -472,15 +565,16 @@ Gets the on/off state of a toggle tool.
 
 \wxheading{Return value}
 
-TRUE if the tool is toggled on, FALSE otherwise.
+true if the tool is toggled on, false otherwise.
 
 \wxheading{See also}
 
 \helpref{wxToolBar::ToggleTool}{wxtoolbartoggletool}
 
+
 \membersection{wxToolBar::InsertControl}\label{wxtoolbarinsertcontrol}
 
-\func{wxToolBarTool *}{InsertControl}{\param{size\_t }{pos}, \param{wxControl *}{control}}
+\func{wxToolBarToolBase *}{InsertControl}{\param{size\_t }{pos}, \param{wxControl *}{control}}
 
 Inserts the control into the toolbar at the given position.
 
@@ -491,9 +585,10 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 \helpref{AddControl}{wxtoolbaraddcontrol},\\
 \helpref{InsertTool}{wxtoolbarinserttool}
 
+
 \membersection{wxToolBar::InsertSeparator}\label{wxtoolbarinsertseparator}
 
-\func{wxToolBarTool *}{InsertSeparator}{\param{size\_t }{pos}}
+\func{wxToolBarToolBase *}{InsertSeparator}{\param{size\_t }{pos}}
 
 Inserts the separator into the toolbar at the given position.
 
@@ -504,12 +599,16 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 \helpref{AddSeparator}{wxtoolbaraddseparator},\\
 \helpref{InsertTool}{wxtoolbarinserttool}
 
+
 \membersection{wxToolBar::InsertTool}\label{wxtoolbarinserttool}
 
-\func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
+\func{wxToolBarToolBase *}{InsertTool}{\param{size\_t }{pos},\rtfsp
 \param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
-\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
-\param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = false},\rtfsp
+\param{wxObject* }{clientData = \NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+
+\func{wxToolBarToolBase *}{InsertTool}{\param{size\_t }{pos},\rtfsp
+\param{wxToolBarToolBase* }{tool}}
 
 Inserts the tool with the specified attributes into the toolbar at the given
 position.
@@ -522,6 +621,7 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 \helpref{InsertControl}{wxtoolbarinsertcontrol},\\
 \helpref{InsertSeparator}{wxtoolbarinsertseparator}
 
+
 \membersection{wxToolBar::OnLeftClick}\label{wxtoolbaronleftclick}
 
 \func{bool}{OnLeftClick}{\param{int}{ toolId}, \param{bool}{ toggleDown}}
@@ -535,11 +635,11 @@ you should use the EVT\_MENU or EVT\_TOOL macro instead.
 
 \docparam{toolId}{The identifier passed to \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.}
 
-\docparam{toggleDown}{TRUE if the tool is a toggle and the toggle is down, otherwise is FALSE.}
+\docparam{toggleDown}{true if the tool is a toggle and the toggle is down, otherwise is false.}
 
 \wxheading{Return value}
 
-If the tool is a toggle and this function returns FALSE, the toggle
+If the tool is a toggle and this function returns false, the toggle
 toggle state (internal and visual) will not be changed. This provides a way of
 specifying that toggle operations are not permitted in some circumstances.
 
@@ -548,6 +648,7 @@ specifying that toggle operations are not permitted in some circumstances.
 \helpref{wxToolBar::OnMouseEnter}{wxtoolbaronmouseenter},\rtfsp
 \helpref{wxToolBar::OnRightClick}{wxtoolbaronrightclick}
 
+
 \membersection{wxToolBar::OnMouseEnter}\label{wxtoolbaronmouseenter}
 
 \func{void}{OnMouseEnter}{\param{int}{ toolId}}
@@ -567,9 +668,10 @@ such as a short description on the status line.}
 
 \wxheading{Remarks}
 
-With some derived toolbar classes, if the mouse moves quickly out of the toolbar, wxWindows may not be able to
+With some derived toolbar classes, if the mouse moves quickly out of the toolbar, wxWidgets may not be able to
 detect it. Therefore this function may not always be called when expected.
 
+
 \membersection{wxToolBar::OnRightClick}\label{wxtoolbaronrightclick}
 
 \func{void}{OnRightClick}{\param{int}{ toolId}, \param{float}{ x}, \param{float}{ y}}
@@ -597,18 +699,17 @@ A typical use of this member might be to pop up a menu.
 \helpref{wxToolBar::OnMouseEnter}{wxtoolbaronmouseenter},\rtfsp
 \helpref{wxToolBar::OnLeftClick}{wxtoolbaronleftclick}
 
+
 \membersection{wxToolBar::Realize}\label{wxtoolbarrealize}
 
 \func{bool}{Realize}{\void}
 
 This function should be called after you have added tools.
 
-If you are using absolute positions for your tools when using a wxToolBarSimple object,
-do not call this function. You must call it at all other times.
 
 \membersection{wxToolBar::RemoveTool}\label{wxtoolbarremovetool}
 
-\func{wxToolBarTool *}{RemoveTool}{\param{int }{id}}
+\func{wxToolBarToolBase *}{RemoveTool}{\param{int }{id}}
 
 Removes the given tool from the toolbar but doesn't delete it. This allows to
 insert/add this tool back to this (or another) toolbar later.
@@ -620,6 +721,15 @@ change to take place, it will happen immediately.
 
 \helpref{DeleteTool}{wxtoolbardeletetool}
 
+
+\membersection{wxToolBar::SetBitmapResource}\label{wxtoolbarsetbitmapresource}
+
+\func{void}{SetBitmapResource}{\param{int }{resourceId}}
+
+Sets the bitmap resource identifier for specifying tool bitmaps as indices
+into a custom bitmap. Windows CE only.
+
+
 \membersection{wxToolBar::SetMargins}\label{wxtoolbarsetmargins}
 
 \func{void}{SetMargins}{\param{const wxSize\&}{ size}}
@@ -645,6 +755,18 @@ default (zero-size) margins are to be overridden.
 
 \helpref{wxToolBar::GetMargins}{wxtoolbargetmargins}, \helpref{wxSize}{wxsize}
 
+
+\membersection{wxToolBar::SetDropdownMenu}\label{wxtoolbarsetdropdownmenu}
+
+\func{bool}{SetDropdownMenu}{\param{int }{id}, \param{wxMenu* }{menu}}
+
+Sets the dropdown menu for the tool given by its \arg{id}. The tool itself will
+delete the menu when it's no longer needed.
+
+If you define a EVT\_TOOL\_DROPDOWN handler in your program, you must call 
+\helpref{wxEvent::Skip()}{wxeventskip} from it or the menu won't be displayed.
+
+
 \membersection{wxToolBar::SetToolBitmapSize}\label{wxtoolbarsettoolbitmapsize}
 
 \func{void}{SetToolBitmapSize}{\param{const wxSize\&}{ size}}
@@ -668,12 +790,25 @@ and not the eventual size of the tool button.
 \helpref{wxToolBar::GetToolBitmapSize}{wxtoolbargettoolbitmapsize},\rtfsp
 \helpref{wxToolBar::GetToolSize}{wxtoolbargettoolsize}
 
+
 \membersection{wxToolBar::SetToolClientData}\label{wxtoolbarsettoolclientdata}
 
-\func{void}{GetToolClientData}{\param{wxObject* }{clientData}}
+\func{void}{SetToolClientData}{\param{int }{id}, \param{wxObject* }{clientData}}
 
 Sets the client data associated with the tool.
 
+
+\membersection{wxToolBar::SetToolDisabledBitmap}\label{wxtoolbarsettooldisabledbitmap}
+
+\func{void}{SetToolDisabledBitmap}{\param{int }{id}, \param{const wxBitmap\& }{bitmap}}
+
+Sets the bitmap to be used by the tool with the given ID when the tool
+is in a disabled state.  This can only be used on Button tools, not
+controls.  NOTE: The native toolbar classes on the main platforms all
+synthesize the disabled bitmap from the normal bitmap, so this
+function will have no effect on those platforms.
+
+
 \membersection{wxToolBar::SetToolLongHelp}\label{wxtoolbarsettoollonghelp}
 
 \func{void}{SetToolLongHelp}{\param{int }{toolId}, \param{const wxString\& }{helpString}}
@@ -695,6 +830,7 @@ You might use the long help for displaying the tool purpose on the status line.
 \helpref{wxToolBar::GetToolLongHelp}{wxtoolbargettoollonghelp},\rtfsp
 \helpref{wxToolBar::SetToolShortHelp}{wxtoolbarsettoolshorthelp},\rtfsp
 
+
 \membersection{wxToolBar::SetToolPacking}\label{wxtoolbarsettoolpacking}
 
 \func{void}{SetToolPacking}{\param{int}{ packing}}
@@ -714,6 +850,7 @@ and for spacing in the horizontal direction if the toolbar is vertical.
 
 \helpref{wxToolBar::GetToolPacking}{wxtoolbargettoolpacking}
 
+
 \membersection{wxToolBar::SetToolShortHelp}\label{wxtoolbarsettoolshorthelp}
 
 \func{void}{SetToolShortHelp}{\param{int }{toolId}, \param{const wxString\& }{helpString}}
@@ -734,6 +871,16 @@ An application might use short help for identifying the tool purpose in a toolti
 
 \helpref{wxToolBar::GetToolShortHelp}{wxtoolbargettoolshorthelp}, \helpref{wxToolBar::SetToolLongHelp}{wxtoolbarsettoollonghelp}
 
+
+\membersection{wxToolBar::SetToolNormalBitmap}\label{wxtoolbarsettoolnormalbitmap}
+
+\func{void}{SetToolNormalBitmap}{\param{int }{id}, \param{const wxBitmap\& }{bitmap}}
+
+Sets the bitmap to be used by the tool with the given ID.  This can
+only be used on Button tools, not controls.
+
+
+
 \membersection{wxToolBar::SetToolSeparation}\label{wxtoolbarsettoolseparation}
 
 \func{void}{SetToolSeparation}{\param{int}{ separation}}
@@ -748,9 +895,10 @@ Sets the default separator size. The default value is 5.
 
 \helpref{wxToolBar::AddSeparator}{wxtoolbaraddseparator}
 
+
 \membersection{wxToolBar::ToggleTool}\label{wxtoolbartoggletool}
 
-\func{void}{ToggleTool}{\param{int }{toolId}, \param{const bool}{ toggle}}
+\func{void}{ToggleTool}{\param{int }{toolId}, \param{bool}{ toggle}}
 
 Toggles a tool on or off. This does not cause any event to get emitted.
 
@@ -758,7 +906,7 @@ Toggles a tool on or off. This does not cause any event to get emitted.
 
 \docparam{toolId}{Tool in question.}
 
-\docparam{toggle}{If TRUE, toggles the tool on, otherwise toggles it off.}
+\docparam{toggle}{If true, toggles the tool on, otherwise toggles it off.}
 
 \wxheading{Remarks}
 
@@ -768,4 +916,3 @@ Only applies to a tool that has been specified as a toggle tool.
 
 \helpref{wxToolBar::GetToolState}{wxtoolbargettoolstate}
 
-
