X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/65afac3fbc6115b899045d767af823fc3abd7322..c9c537e6b06e7ca0160de52b7a91901aef0381e0:/docs/latex/wx/tlw.tex

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index dfdf848b7a..770b9e34cd 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -86,6 +86,14 @@ Returns \true if this window is currently active, i.e. if the user is currently
 working with it.
 
 
+\membersection{wxTopLevelWindow::IsAlwaysMaximized}\label{wxtoplevelwindowisalwaysmaximized}
+
+\constfunc{virtual bool}{IsAlwaysMaximized}{\void}
+
+Returns \true if this window is expected to be always maximized, either due to platform policy
+or due to local policy regarding particular class.
+
+
 \membersection{wxTopLevelWindow::Iconize}\label{wxtoplevelwindowiconize}
 
 \func{void}{Iconize}{\param{bool}{ iconize}}
