X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/659f4d7615abfb6ee35e73d1d4f765a5ee39fad3..e815120e412d91e79c98dd0afac2a1e399f10810:/docs/latex/wx/glcanvas.tex

diff --git a/docs/latex/wx/glcanvas.tex b/docs/latex/wx/glcanvas.tex
index b94a4805c2..c6e293d7de 100644
--- a/docs/latex/wx/glcanvas.tex
+++ b/docs/latex/wx/glcanvas.tex
@@ -40,6 +40,10 @@ your program is linked with). On Unix, pass {\tt --with-opengl} to configure.
 
 <wx/glcanvas.h>
 
+\wxheading{Library}
+
+\helpref{wxGl}{librarieslist}
+
 \wxheading{Window styles}
 
 There are no specific window styles for this class.
@@ -58,7 +62,7 @@ alpha channel, and accum buffer. Other implementations may support them.
 \twocolitem{\windowstyle{WX\_GL\_LEVEL}}{0 for main buffer, >0 for overlay, <0 for underlay}
 \twocolitem{\windowstyle{WX\_GL\_DOUBLEBUFFER}}{Use doublebuffer}
 \twocolitem{\windowstyle{WX\_GL\_STEREO}}{Use stereoscopic display}
-\twocolitem{\windowstyle{WX\_GL\_AUX\_BUFFERS}}{Number of auxiliary buffers (not all implementation support this option)}
+\twocolitem{\windowstyle{WX\_GL\_AUX\_BUFFERS}}{Number of auxiliary buffers (not all implementations support this option)}
 \twocolitem{\windowstyle{WX\_GL\_MIN\_RED}}{Use red buffer with most bits (> MIN\_RED bits)}
 \twocolitem{\windowstyle{WX\_GL\_MIN\_GREEN}}{Use green buffer with most bits (> MIN\_GREEN bits) }
 \twocolitem{\windowstyle{WX\_GL\_MIN\_BLUE}}{Use blue buffer with most bits (> MIN\_BLUE bits) }
@@ -138,7 +142,7 @@ isn't yet shown at this moment.
 
 \membersection{wxGLCanvas::SetColour}\label{wxglcanvassetcolour}
 
-\func{void}{SetColour}{\param{const char*}{ colour}}
+\func{void}{SetColour}{\param{const wxString\&}{ colour}}
 
 Sets the current colour for this window (using \texttt{glcolor3f()}), using the
 wxWidgets colour database to find a named colour.
