X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/659f4d7615abfb6ee35e73d1d4f765a5ee39fad3..daf5b37afdda9e8ab7f909e01ffd6387219a80ea:/docs/latex/wx/glcontext.tex?ds=sidebyside

diff --git a/docs/latex/wx/glcontext.tex b/docs/latex/wx/glcontext.tex
index 7cc72610e3..057977aad2 100644
--- a/docs/latex/wx/glcontext.tex
+++ b/docs/latex/wx/glcontext.tex
@@ -15,6 +15,10 @@ was initialized. (This applies to sharing display lists among contexts analogous
 
 Note that some wxGLContext features are extremely platform-specific - its best to check your native platform's glcanvas header (on windows include/wx/msw/glcanvas.h) to see what features your native platform provides.
 
+\wxheading{Library}
+
+\helpref{wxGl}{librarieslist}
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
