X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/659f4d7615abfb6ee35e73d1d4f765a5ee39fad3..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/stopwtch.tex

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 33349bb46e..1f756a493f 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -19,6 +19,10 @@ use it to measure the time elapsed by some function:
 
 <wx/stopwatch.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxTimer}{wxtimer}
