X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/659f4d7615abfb6ee35e73d1d4f765a5ee39fad3..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/cmdlpars.tex?ds=sidebyside

diff --git a/docs/latex/wx/cmdlpars.tex b/docs/latex/wx/cmdlpars.tex
index d9c3255d4d..e7ab669a51 100644
--- a/docs/latex/wx/cmdlpars.tex
+++ b/docs/latex/wx/cmdlpars.tex
@@ -53,6 +53,10 @@ No base class
 
 <wx/cmdline.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Constants}
 
 The structure wxCmdLineEntryDesc is used to describe the one command
