X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/63e819f2981585279fe8a06629f69b7002eee9dc..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/mcaptevt.tex

diff --git a/docs/latex/wx/mcaptevt.tex b/docs/latex/wx/mcaptevt.tex
index fc6d032f9d..265e58a47b 100644
--- a/docs/latex/wx/mcaptevt.tex
+++ b/docs/latex/wx/mcaptevt.tex
@@ -17,6 +17,10 @@ This event is implemented under Windows only.
 
 <wx/event.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To process this event, use the following event handler macro to direct input to a member
@@ -72,6 +76,10 @@ This event is currently emitted under Windows only.
 
 <wx/event.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To process this event, use the following event handler macro to direct input to
@@ -97,3 +105,4 @@ a member function that takes a wxMouseCaptureLostEvent argument.
 \func{}{wxMouseCaptureLostEvent}{\param{wxWindowID }{windowId = 0}}
 
 Constructor.
+
