X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/63e819f2981585279fe8a06629f69b7002eee9dc..3e1512cdfecd2c531567e6603083d9c3968216c7:/docs/latex/wx/mcaptevt.tex

diff --git a/docs/latex/wx/mcaptevt.tex b/docs/latex/wx/mcaptevt.tex
index fc6d032f9d..cd475da9cb 100644
--- a/docs/latex/wx/mcaptevt.tex
+++ b/docs/latex/wx/mcaptevt.tex
@@ -97,3 +97,4 @@ a member function that takes a wxMouseCaptureLostEvent argument.
 \func{}{wxMouseCaptureLostEvent}{\param{wxWindowID }{windowId = 0}}
 
 Constructor.
+
