X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/636673eddae1e7decc91e36e9a6be32a3af7ec5d..82ce8b17f728fe648f431b379ba23721e0ebc06d:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 34d88a49a0..437cd23a79 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -173,6 +173,13 @@ called by the user code.
 \docparam{child}{Child window to add.}
 
 
+\membersection{wxWindow::CacheBestSize}\label{wxwindowcachebestsize}
+
+\constfunc{void}{CacheBestSize}{\param{const wxSize\& }{size}}
+
+Sets the cached best size value.
+
+
 \membersection{wxWindow::CaptureMouse}\label{wxwindowcapturemouse}
 
 \func{virtual void}{CaptureMouse}{\void}
@@ -470,6 +477,15 @@ Returns {\tt true} if the window has been disabled, {\tt false} if it had been
 already disabled before the call to this function.
 
 
+\membersection{wxWindow::DoGetBestSize}\label{wxwindowdogetbestsize}
+
+\constfunc{virtual wxSize}{DoGetBestSize}{\void}
+
+Gets the size which best suits the window: for a control, it would be
+the minimal size which doesn't truncate the control, for a panel - the
+same size as it would have after a call to \helpref{Fit()}{wxwindowfit}.
+
+
 \membersection{wxWindow::DoUpdateWindowUI}\label{wxwindowdoupdatewindowui}
 
 \func{virtual void}{DoUpdateWindowUI}{\param{wxUpdateUIEvent\&}{ event}}
@@ -2592,6 +2608,13 @@ the constraints automatically in OnSize; otherwise, you must override OnSize and
 explicitly. When setting both a wxLayoutConstraints and a \helpref{wxSizer}{wxsizer}, only the
 sizer will have effect.
 
+\membersection{wxWindow::SetInitialBestSize}\label{wxwindowsetinitialbestsize}
+
+\func{virtual void}{SetInitialBestSize}{\param{const wxSize\& }{size}}
+
+Sets the initial window size if none is given (i.e. at least one of the
+components of the size passed to ctor/Create() is wxDefaultCoord).
+
 \membersection{wxWindow::SetMaxSize}\label{wxwindowsetmaxsize}
 
 \func{void}{SetMaxSize}{\param{const wxSize\& }{size}}
