X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/62d3ee70e51f335188a788372a3e66acbcd0bb63..fcf77487edae715c75f0f802a96e203d88dd56c6:/docs/latex/wx/listctrl.tex?ds=sidebyside

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 9aef15d27c..b6b620cc78 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -14,7 +14,12 @@ without consuming much memory. To use virtual list control you must use
 \helpref{OnGetItemText}{wxlistctrlongetitemtext} (and optionally 
 \helpref{OnGetItemImage}{wxlistctrlongetitemimage} and 
 \helpref{OnGetItemAttr}{wxlistctrlongetitemattr}) to return the information
-about the items when the control requests it.
+about the items when the control requests it. Virtual list control can be used
+as a normal one except that no operations which can take time proportional to
+the number of items in the control happen -- this is required to allow having a
+practically infinite number of items. For example, in a multiple selection
+virtual list control, the selections won't be sent when many items are selected
+at once because this could mean iterating over all the items.
 
 Using many of wxListCtrl features is shown in the
 \helpref{corresponding sample}{samplelistctrl}.
@@ -289,9 +294,12 @@ or small icon view).
 
 \membersection{wxListCtrl::GetEditControl}\label{wxlistctrlgeteditcontrol}
 
-\constfunc{wxTextCtrl\&}{GetEditControl}{\void}
+\constfunc{wxTextCtrl *}{GetEditControl}{\void}
 
-Gets the edit control for editing labels.
+Returns the edit control being currently used to edit a label. Returns {\tt NULL}
+if no label is being edited.
+
+{\bf NB:} It is currently only implemented for wxMSW.
 
 \membersection{wxListCtrl::GetImageList}\label{wxlistctrlgetimagelist}
 
@@ -606,12 +614,12 @@ the given {\it column} for the specified {\tt item}.
 
 \func{bool}{ScrollList}{\param{int }{dx}, \param{int }{dy}}
 
-Scrolls the list control. If in icon, small icon or report view mode,
-dx specifies the number of pixels to scroll. If in list view mode, dx
-specifies the number of columns to scroll.
+Scrolls the list control. If in icon, small icon or report view mode, 
+{\it dx} specifies the number of pixels to scroll. If in list view mode, 
+{\it dx} specifies the number of columns to scroll. {\it dy} always specifies
+the number of pixels to scroll vertically.
 
-If in icon, small icon or list view mode, dy specifies the number of pixels
-to scroll. If in report view mode, dy specifies the number of lines to scroll.
+{\bf NB:} This method is currently only implemented in the Windows version.
 
 \membersection{wxListCtrl::SetBackgroundColour}\label{wxlistctrlsetbackgroundcolour}
 
