X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/62313c27880d28ef7c036e453ebf713d31379d7c..2c6f14e1a7b5062fcf77eda40824d820d9ac288e:/docs/latex/wx/listevt.tex

diff --git a/docs/latex/wx/listevt.tex b/docs/latex/wx/listevt.tex
index 2c47de8d20..76c42a3cb1 100644
--- a/docs/latex/wx/listevt.tex
+++ b/docs/latex/wx/listevt.tex
@@ -70,9 +70,9 @@ list control advises us to cache.
 For {\tt EVT\_LIST\_CACHE\_HINT} event only: return the last item (inclusive)
 which the list control advises us to cache.
 
-\membersection{wxListEvent::GetCode}\label{wxlisteventgetcode}
+\membersection{wxListEvent::GetKeyCode}\label{wxlisteventgetkeycode}
 
-\constfunc{int}{GetCode}{\void}
+\constfunc{int}{GetKeyCode}{\void}
 
 Key code if the event is a keypress event.
 
@@ -91,12 +91,6 @@ dragging events, it is the column to the left of the divider being dragged, for
 the column click events it may be $-1$ if the user clicked in the list control
 header outside any column.
 
-\membersection{wxListEvent::Cancelled}\label{wxlisteventcancelled}
-
-\constfunc{bool}{Cancelled}{\void}
-
-TRUE if this event is an end edit event and the user cancelled the edit.
-
 \membersection{wxListEvent::GetPoint}\label{wxlisteventgetpoint}
 
 \constfunc{wxPoint}{GetPoint}{\void}
