X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/61639efb6658a7a02dd8b0072c6e0bb4826ef654..6d3c4b2aee2a64ba3245f2cec9751e4608a9bc3c:/docs/latex/wx/libs.tex

diff --git a/docs/latex/wx/libs.tex b/docs/latex/wx/libs.tex
index 27bfd64ea3..636044dae4 100644
--- a/docs/latex/wx/libs.tex
+++ b/docs/latex/wx/libs.tex
@@ -107,8 +107,8 @@ contained in this library, as well as
 {\large {\bf wxQA}}
 
 This is the library containing extra classes for quality assurance. Currently
-it only contains classes for generating and processing debug reports in case of
-program crash or exception, but more classes will be added to it in the future.
+it only contains \helpref{wxDebugReport}{wxdebugreport} and related classes,
+but more will be added to it in the future.
 
 Requires wxCore, wxBase and wxXML.
 
