X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/60fef9643dfbe219c51db7218d9cfa846b258f2c..355debca0650f70aa8ed4803b2ebc45541e03d9f:/docs/latex/wx/tlw.tex

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index c4e0534a30..770b9e34cd 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -69,6 +69,15 @@ Gets a string containing the window title.
 \helpref{wxTopLevelWindow::SetTitle}{wxtoplevelwindowsettitle}
 
 
+\membersection{wxTopLevelWindow::HandleSettingChange}\label{wxtoplevelwindowhandlesettingchange}
+
+\func{virtual bool}{HandleSettingChange}{\param{WXWPARAM}{ wParam}, \param{WXLPARAM}{ lParam}}
+
+Unique to the wxWinCE port. Responds to showing/hiding SIP (soft input panel) area and resize
+window accordingly. Override this if you want to avoid resizing or do additional
+operations.
+
+
 \membersection{wxTopLevelWindow::IsActive}\label{wxtoplevelwindowisactive}
 
 \constfunc{bool}{IsActive}{\void}
@@ -77,6 +86,14 @@ Returns \true if this window is currently active, i.e. if the user is currently
 working with it.
 
 
+\membersection{wxTopLevelWindow::IsAlwaysMaximized}\label{wxtoplevelwindowisalwaysmaximized}
+
+\constfunc{virtual bool}{IsAlwaysMaximized}{\void}
+
+Returns \true if this window is expected to be always maximized, either due to platform policy
+or due to local policy regarding particular class.
+
+
 \membersection{wxTopLevelWindow::Iconize}\label{wxtoplevelwindowiconize}
 
 \func{void}{Iconize}{\param{bool}{ iconize}}
@@ -127,10 +144,6 @@ Maximizes or restores the window.
 
 \docparam{maximize}{If \true, maximizes the window, otherwise it restores it.}
 
-\wxheading{Remarks}
-
-This function only works under Windows.
-
 \wxheading{See also}
 
 \helpref{wxTopLevelWindow::Iconize}{wxtoplevelwindowiconize}
@@ -258,6 +271,17 @@ Sets the window title.
 \helpref{wxTopLevelWindow::GetTitle}{wxtoplevelwindowgettitle}
 
 
+\membersection{wxTopLevelWindow::ShouldPreventAppExit}\label{wxtoplevelwindowshouldpreventappexit}
+
+\constfunc{virtual bool}{ShouldPreventAppExit}{\void}
+
+This virtual function is not meant to be called directly but can be overridden
+to return \false (it returns \true by default) to allow the application to
+close even if this, presumably not very important, window is still opened.
+By default, the application stays alive as long as there are any open top level
+windows.
+
+
 \membersection{wxTopLevelWindow::ShowFullScreen}\label{wxtoplevelwindowshowfullscreen}
 
 \func{bool}{ShowFullScreen}{\param{bool}{ show}, \param{long}{ style = wxFULLSCREEN\_ALL}}
